#Title

Product Diesel Kerosene Petrol Furnace Oil
PRICING OF FUEL
(Tk per litre)
Current Price
105.5
105.5
121
86
Import Cost
50
50
60.68
42.29
Total
Cost
95
97.4
109.67
85.29
Margin Between cost and price
10.5
8.1
11.32
0.71
FY 2020
FY 2021
FY 2022
FY 2023
FY 2024
5065
6493
-2705
4586
3500