Bellingham, Kane
FROM PAGE 12
Gareth Southgate’s reign as England boss.
Kane then headed in just a minute into extra-time to set up a quarter-final meeting with Switzerland on Saturday.
“That’s the desire and the attitude from the boys. It looked tough for a second there but you keep going... Jude does what Jude does and what an unbelievable goal,” Kane said.
Southgate looked certain to fall on his sword after steadfastly refusing to make changes to a side that stumbled through as winners of Group C despite scoring just two goals in three games.
Kobbie Mainoo was introduced for his first competitive start in Southgate’s only change and he paid the price with another lacklustre display lacking in any speed or invention for long spells.
The one saving grace of England’s performances in the group stage was that a makeshift defence had held up well, conceding just once in three games.
However, they were torn to pieces early on by a Slovakia side ranked 45th in the world.
England did not heed a couple of warnings as David Hancko and Lukas Haraslin were wasteful with big chances.
Slovakia finally punished their more illustrious opponents when David Strelec was given acres of room to turn and play in Schranz, who confidently stroked past Jordan Pickford for his third goal of the tournament.
Despite his lack of experience, Mainoo was one of the few players who threatened to spark England into life as the Manchester United midfielder’s effort was deflected wide.
The half-time whistle was met with a chorus of boos but Southgate still stuck to his guns and did not make a change until 25 minutes to go.
England did at least improve on a dismal first half and had the ball in the net within five minutes of the restart.
Phil Foden turned in Kieran Trippier’s cross but was caught offside after a VAR review.
Slovakia should have doubled their lead shortly afterwards when England gave away possession and Strelec saw Pickford well off his line but failed to hit the target from the halfway line.
Southgate’s hand was finally forced on 66 minutes by an injury to Trippier.
With Luke Shaw not match-fit, Bukayo Saka was forced to deputise at left-back to make room for the introduction of Cole Palmer.
England’s chances seemed to have gone when Kane headed wide a golden opportunity and Declan Rice smashed the post with a long-range pot shot.
However, there was an incredible twist as Bellingham acrobatically turned home Guehi’s flick-on from a throw-in in the final moments of added-on time.
Kane hailed the goal as “one of the best in our country’s history, I reckon”.
The Brentford striker headed Eberechi Eze’s mishit shot back across goal for Kane to power home his second goal of the tournament.