#Title
PROFIT/LOSS OF MAJOR FIRMS

Reasons behind profit fall in power companies

Loss from local currency devaluation Higher finance costs No capacity charge under new contracts
Why profit rose in fuel companies
Higher income from bank deposits
Company name
Doreen Power
Energypac Power
Power Grid
Shahjibazar Power
United Power
MJL Bangladesh
Meghna Petroleum
Padma Oil
Jamuna Oil
In 2021-22
167
-7
121
79
1,125
188
316
240
186
In 2022-23
64
-56
-626
28
1,333
276
442
349
340
Forex loss, total profits and sales
(In crore taka)
SOURCE: FINANCIAL STATEMENT