#Title

Narendra Modi Stadium, Ahmedabad
The largest sports stadium in the world will host the tournament opener between England and New Zealand on October 5, India v Pakistan fixture on October 14, and the final on November 19.
Capacity: 132,000.
M Chinnaswamy Stadium, Bengaluru
With boundary sizes of around 65 metres, high scores are expected.
Capacity: 40,000
MA Chidambaram Stadium, Chennai
On the Indian Ocean, the ground will likely be the most humid across all venues.
Capacity: 38,000
Arun Jaitley Stadium, Delhi
A venue steeped in cricketing history, the pace of the wicket in India’s capital has sped up, suggesting higher scores than numbers may suggest.
Capacity: 55,000
Himachal Pradesh Cricket Association (HPCA) Stadium, Dharamsala
With its picturesque views of the Himalayan mountains in the distance, the ground is on the smaller side and should see high-scoring encounters.
Capacity: 23,000
Eden Gardens, Kolkata
The ground is known for its lively pitch and breezy conditions next to the Hooghly River.
Capacity: 66,000
BRSABV Ekana Cricket Stadium, Lucknow
A newer ground, Lucknow’s stadium is largely unknown on the international front, though the venue has seen marked use in the T20 format through the Indian Premier League.
Capacity: 50,000
Wankhede Stadium, Mumbai
The distinct red-soil pitch will no doubt play its part in the tournament, most notably in one of the semi-finals on November 15.
Capacity: 32,000
MCA International Stadium, Pune
The stadium in the outskirts of Pune has hosted international play for over a decade, and boasts five matches, including an intriguing New Zealand v South Africa fixture on November 1.
Capacity: 42,700
Rajiv Gandhi International Stadium, Hyderabad
The stadium will host three matches, all within the first seven days of the tournament.
Capacity: 40,000