#Title
FY
2017-18
2018-19
2019-20
2020-21
2021-22
TOTAL
GOVT PLANT
12
12
18
15
13
PRIVATE PLANT
7
13
3
0
FIXED COST PAID
Tk 253cr
Tk 778cr
Tk 1,724cr
Tk 334cr
Tk 733cr
Tk 3,822cr
Bangladesh is misusing the capacity payment model.
Prof M Tamim Energy expert