#Title

BNS: An expensive facelift
PHOTO: FIROZ AHMED
The Bangabandhu National Stadium (BNS) was supposed to get a new look all around at the end of its biggest-ever renovation work in December, at a cost of 98 crore taka as per the original budget. But a budget increase of Tk 60 crore and delay in approval of the new budget means the project to renovate the country’s premier multi-purpose venue will likely take at least six more months from the original schedule to complete.
ANISUR RAHMAN
The lengthy renovation work has kept football and athletics -- the two sports which used to be hosted here exclusively since cricket’s exodus to Mirpur – for the last two years.
Established in 1954, the BNS, formerly known as the Dhaka Stadium, went through a number of quick-fixes over the last two decades before the ongoing renovation work started in late 2021.
The iconic establishment, for a long time, was a concrete structure accommodating as many spectators as possible, playing the role of a national obsession and hosted anything and everything whenever big sporting occasions came up. Unfortunately, the stadium never became a centre of sporting excellence or a place that people can refer to as a ‘state-of-the-art’ venue.
However, despite the delay there is hope in sports fraternity that once the new athletics turf is laid and once the pitch is ready, the whole venue will take a new look and will host domestic and international sporting events without any further interruption.
Before the ongoing project was taken up by the Ministry of Youth and Sports, The Daily Star Sport ran a story in early 2018, making recommendations to incorporate facilities that a modern stadium possesses by curtailing unnecessary expenditures.
The ministry took the recommendations into cognizance, revising the project by including a well-equipped gymnasium, an international-standard waterlogging-free ground, overhaul of two shabby dressing rooms use for the domestic matches, women-friendly wash rooms on the top of the gallery and designated space for physically challenged spectators.
MAJOR RENOVATION WORKS
GALLERY SHED: The stadium was gradually developed since its establishment and the eastern side was one-storied until extension works began ahead of hosting the Asian Youth Football Championship in 1978. However, no initiative was taken to put sheds above the gallery to give comfort to the spectators. The current project, though, will install sheds from the western to the eastern gallery, keeping 100 feet open either side of the torch.
The initial measurement of installing the shed was 80,000 square-feet, for a cost of Tk 23 crore but redesigning of the shed-structure saw its width increased to 123 feet from previous 67 feet. Thus, the total measurement of the shed has now stood at 1.5 lakh square-feet and the expenditure has increased by nearly Tk 20 crore. The shipment of PVDF membrane shed has already been completed and it will take nearly two months to set up the shed on the existing structures, according to the National Sports Council.
CHAIRS IN THE GALLERY: A total of 23,500 chairs were installed at the general and VIP galleries before the opening ceremony of the 2011 ICC World Cup but most of those chairs, especially at the general galleries, were damaged within 10 years. All 18,000 old chairs at the general gallery have been removed and are waiting to be replaced with new ones while another 5000 chairs for VIP galleries and VIP boxes have already been imported.
FLOODLIGHTS: All types of matches used to be held in daylight at the big bowl before floodlights were installed for hosting the Aga Khan Gold Cup in 1977. However, the brightness of the lights reduced gradually over the years. The initial the budget for the metal halide floodlights was estimated at Tk 13 crore, but it has jumped to Tk 40 crore due to the proposed installation of LED floodlights following suggestion from the Bangladesh Football Federation. The floodlights will be installed once the proposal is approved by the executive committee of the national economic council (ECNEC).
GROUND: Ground condition used to be a major issue when hosting football matches -- domestic or international. Even in the face of moderate shower, the ground often turned unplayable due to poor drainage system, forcing the BFF to reschedule domestic matches quite often.
For quick rain water removal, the ground has been developed with three layers of sand, brick and soil beneath perforated RCC pipes installed all around to take away the water to the drain. The surface of the ground is likely to be better than before as there will be a mixture of two types of grass – Royal Bengal and Bermuda – planned by a company under the supervision of the BFF. To turn the surface wet before the start of games, auto-sprinklers have been installed. It is hoped that matches will no longer be deferred due to ground conditions.
ATHLETICS TRACK: The previous athletics track was installed in 2005 for a cost of Tk 10 crore, but the track suffered wear and tear over the years – resulting from hosting some big events, including the opening ceremonies of 2010 SA Games and 2011 ICC World Cup and the Tri-Nation Big Show. The wear and tear and holes put athletes in risk of major injuries, prompting the authorities in deciding a new track. The new track will cost Tk 19 crore, which will include expenditure for track-cleansing machine and an electronic timer to record timing of track & field events.
DRESSING ROOMS: Ahead of the international friendly football match between Argentina and Nigerian in Dhaka in 2011, two well-decorated 22-seater dressing rooms were built, with enough toilets, urinals, ice-baths, hot-and-cold showers and lockers. Those two dressing rooms were later renovated. However, the two dressing rooms on the ground floor for domestic matches were in shabby condition, which will be turned into well-decorated 17-seater dressing rooms following the renovation work.
GYMNASIUM: There was never any gymnasium at the stadium, which forced athletes do workouts at private gyms. After the renovation, there will be an 800-square-feet gymnasium in between the two international dressing rooms with cycling machines, multi-gym stations and other equipment.
PRESS BOX: Nearly 100 sports journalists survived catastrophe after a hanging roof of the BNS press box collapsed a few hours after Bangladesh’s FIFA World Cup pre-qualifying match against Tajikistan in October 2007. Following that incident, the seating arrangement of the press box was built up with vertical columns with entrance inside the gallery. The renovation will see a spacious press box, better washroom facilities, an additional floor for VIP guests, an extra space for TV camera stands, strengthening the existing pillar and a new stair built outside the gallery. The initial budget for press box was Tk 1.8 crore while the revised budget is Tk 5.2 crore.
OTHERS: The project authority could not restore the original washrooms from the shop-laden stadium but it set up eight women-friendly washrooms on the galleries, each washroom featuring two high commodes, two low-pans, four urinals and three basins.
The authority also has a plan to have a designated area for physically challenged spectators, who will likely take their seats either side of the VIP gates. The revised project will also see a wider entrance of the VVIP gate, with archive board on both walls along with a mural depicting Bangabandhu Sheikh Mujibur Rahman’s life.
Apart from the digital advertisement boards to be installed on three corners of the football pitch, there will be generators, an LED giant screen, security lights, PA system, ticket counters, seating arrangements in dugout and a 20kw solar panel.