Ruthless Djokovic returns to the top
REUTERS, New York
Novak Djokovic made a winning return to the U.S. Open by storming past Frenchman Alexandre Muller 6-0, 6-2, 6-3 on Monday to reclaim the world number one ranking and take the first step towards matching Margaret Court’s record haul of 24 Grand Slams.
Unable to play at last year’s event due to being unvaccinated against COVID-19, Djokovic had not been seen on the Flushing Meadows hard courts since his loss to Daniil Medvedev in the 2021 final.
And fans let the 36-year-old know they had missed him, showering the Serb with applause as he emerged from the tunnel onto Arthur Ashe Stadium court.
It was clear that the three-time champion had missed them as well as he embraced the cheers of a record crowd of over 30,000 that included former-U.S. President Barack Obama and his wife Michelle.
“I was excited to go out on the court, it has been a couple of years so to come in front of you guys is always a pleasure,” Djokovic told the New York crowd. “Thanks for coming out and thanks to all the people who stayed to almost 1 a.m..
“Night sessions at Arthur Ashe are always something special.”
Arriving in New York on the back of an absorbing win over his young rival Carlos Alcaraz in the Cincinnati Open final, an in-form Djokovic showed the 84th ranked Muller no mercy in what was his U.S. Open main draw debut.
Firing on all cylinders, Djokovic broke the overwhelmed Frenchman to open the match and never took his foot off the gas, closing out the first set in 23 minutes with a thundering ace.
Djokovic broke Muller for a fourth time to open the second set and went 2-0 up before his opponent held serve for the first time, raising both hands in triumph as the crowd roared.
But the cheers would be few and far between as Djokovic closed out the second with a wicked forehand.
Muller showed more ambition in the third, taking the set to 3-3 before Djokovic took control by breaking the Frenchman twice on the way to closing out the match.
“I couldn’t serve well in the second and third, I dropped the level of my serve and had to work for my points a bit more,” said Djokovic. “Nevertheless I think I played great from the beginning to the end.
“Some hiccups but I liked the level and hopefully I can maintain it in the next round as well.”
While the U.S. Open has just got underway, Djokovic’s win guarantees he will nudge Alcaraz out of top spot when the world rankings are updated on Sept. 11.
Next up for number two seed Djokovic is Spain’s Bernabe Zapata Miralles, who was a straight sets winner over American Ethan Quinn.
Meanwhile, women’s world number one Iga Swiatek and American rival Coco Gauff advanced to the second round.
Djokovic’s arrival on court had been delayed after a gruelling three-set battle between American teenager Gauff and Germany’s Laura Siegemund in the preceding night game.
The 19-year-old Gauff, tipped by many as the biggest threat to defending US Open champion Swiatek, was forced to dig deep before winning 3-6, 6-2, 6-4 in 2hr 50min.
In other women’s games on Monday, defending champion Swiatek needed less than hour to defeat Sweden’s Rebecca Peterson 6-0, 6-1.