#Title
AT A GLANCE
Length 19.73 km
Number of ramps 31
Total length with ramps 46.73 km
Project cost Tk 8,940 cr
Land acquisition, resettlement costs Tk 4,917.57 cr
LINKS AIRPORT TO KUTUBKHALI ON DHAKA-CHATTOGRAM HIGHWAY
AIRPORT TO FARMGATE
Total length 11km; total ramps 15
1 entry, 1 exit at Airport
2 entries, 1 exit at Kuril
2 exits, 1 entry at Banani
1 entry at Chairmanbari
2 exits, 1 entry at Mohakhali
2 entries at Bijaysarani
1 exit at Farmgate
PROJECT’S PVT PARTNERS
First PPP project in transport sector with foreign investment
Italian Thai Development Public Company Ltd (Thailand) 51pc stake
China Shandong International Economic and Technical Co-operation Group, China 34pc stake
Sinohydro Cooperation Ltd 15pc stake
The companies will build, operate and collect toll until 2044