Dropped calls irk phone users
FROM PAGE 1
over 48 crore call drops were experienced by their subscribers in the eight months, according to BTRC.
However, Md Quamruzzaman Ripon, a Robi subscriber who lives in the capital’s Lalmatia, said he experienced fewer call drops this year compared to last year.
“Robi’s call drop in the given time is less than 1 percent which is well below BTRC’s standard rate of 2 percent for call drops,” said Robi Axiata in an email reply yesterday.
Robi Axiata also said in Bangladesh, mobile operators are being forced to operate within a limited spectrum (the radio frequencies allocated to the mobile industry and other sectors for communication over the airwaves) principally due to price issues.
In order to ensure quality services, there is no alternative to allocation of adequate amount of spectrum to operators considering the number of people they serve, it added.
Those in rural areas seem to encounter call drops and poor signals more frequently than city residents.
Jayed Rahman, a resident of Gopalganj’s Muksudpur, subscribes to the services of three operators -- Grameenphone (GP), Banglalink and Robi.
“While at home I face network problems with all three operators. But the worst experience is with GP’s network,” said Rahman.
However, some living in the capital using dual networks at a time said GP is comparatively better as it has fewer call drops and instances of poor signals.
There were over 46 crore call drops for GP users in eight months. The leading operator has 7.75 crore subscribers as of September.
Banglalink users Tanzina Aktari Moumi, who has been living at Bogura town’s Colony area since the pandemic hit Bangladesh, has given up using Banglalink in May after facing frequent call drops.
“In a 10-minute call, there were three-four call drops. I was so fed up that I switched to another operator,” she said
However, Abdus Salam of Habiganj said he has been using Banglalink, which now has 3.47 crore subscribers, for over a decade and its network is good.
Banglalink subscribers experienced 14.65 crore call drops in the first eight months this year, putting the operator in a better position than top rivals Grameenphone and Robi Axiata in terms of call drop figures.
“Our call drop rate is much lower than the benchmark set by BTRC. In order to ensure the best digital and voice services, we purchased 10.6 MHz spectrum back in 2018,” said Taimur Rahman, chief corporate and regulatory affairs officer of Banglalink.
There is 1 Megahertz spectrum for around every 1.1 million Banglalink users, which is the highest ratio among operators other than Teletalk.
Zehad Al Mehedi, a customer of state-owned mobile operator Teletalk residing in Dhaka, often faces call drops and poor signals during conversations with his parents in Bagerhat.
There were 4.11 crore call drops in the eight-month period for Teletalk customers.
Posts and Telecommunications Minister Mustafa Jabbar recently told The Daily Star he is concerned about frequent call drops.
“Our telcos are doing well in many areas but there is some technical advancement needed to address the issue of call drops,” he said.
He stressed on tougher regulatory measures to ensure customers’ rights.
However, mobile phone operators argued the industry average for call drops is lower than the average of the developed world with the telecom regulator’s ceiling of 2 percent.
“Any number becomes cognisable when compared with the relevant data. So, an average 14-crore call drops per month should be compared with the total number of generated calls during the period to get the actual picture,” said Brig Gen SM Farhad (Retd), secretary general of the Association of Mobile Telecom Operators of Bangladesh.
“Moreover, call drops are very natural for wireless services for multiple reasons, such as weather, network conditions, network pockets, network interference, unauthorised jammers, cable cuts, etc.,” he said.
However, in Bangladesh, the mobile call drop rate is within the regulators’ threshold, he added.
In the last two years, mobile and internet subscribers increased by over 1 crore and nearly 2 crore respectively.
However, there were no new towers in Bangladesh since then, prompting service quality to decline gradually.
The government in 2018 had approved four applications for tower operation licences, but due to a lack of consensus between tower-sharing operator licensees and telecom operators, and regulatory issues, there have not been any new towers built yet.