#Title

Warner outdoes the Don

Smith becomes fastest to 7,000 Test runs
Afp, Adelaide
An irrepressible David Warner smashed an unbeaten 335 on Saturday while Steve Smith became the fastest man to 7,000 Test runs as Australia took control of the day-night second Test against Pakistan.
Skipper Tim Paine waved his players back into the pavilion at 589 for three ahead of the second day’s dinner break with Warner on the 10th highest Test score ever, also a personal best.
The decision to declare deprived him of a crack at Brian Lara’s all-time high 400 not out, but it proved to be the right one with the Australian bowlers quickly tearing through Pakistan’s hapless top order under the Adelaide Oval lights.
They finished in deep trouble at 96 for six with Mitchell Starc grabbing four of them.Babar Azam was not out 43 and Yasir Shah was on four.
“It’s just sunk in to me that it is very rare that you get these opportunities... I’ll cherish this moment for the rest of my life, definitely,” said Warner on making such a big score.
“More importantly, the partnerships we put on. It just showed how much pride we have as a batting unit running between the wickets. If I’m doing my job well and putting the team in the best position, we’re going to win a lot of games,” he added.
The visitors, who have lost 13 consecutive Tests in Australia, enjoyed little success in a long day in the field as they look to avoid a 2-0 series defeat.
But they did remove Marnus Labuschagne for 162 in the opening session and also bagged Smith, caught behind by Mohammad Rizwan off Shaheen Afridi for 36.
In making his runs, Smith shattered a record that had stood since 1946.
He took a single off Muhammad Musa to reach 7,000 runs in his 126th innings, taking possession of a mark held for 73 years by English great Wally Hammond who reached the milestone in his 131st innings.
Smith also moved past legendary countryman Donald Bradman’s 6,996 Test runs to become Australia’s 11th highest scorer.- Standing ovation -
The home team resumed the day at 302 for one with Warner on 166 and Labuschagne 126, with the pair putting on another 67 runs before Pakistan finally got a breakthrough.
Skipper Azhar Ali took the new ball and Afridi clean-bowled Labuschagne for 162 as he attempted a drive.
Their marathon 361-run partnership was a record second-wicket stand for Australia against Pakistan and the highest ever in a pink-ball Test.
Minutes later, Warner completed only the second Test double century of his career. Playing in his 81st Test, he reached 200 with a single from Afridi, having clattered 23 fours along the way.
Pakistan thought they finally had him out on 226 when he was caught in the gully off debutant Musa, only for their heads to drop when it was called a no-ball.
Warner made them pay, reaching a triple century off 389 balls to join an elite club. He raced to 335, one more than former captain Mark Taylor’s epic 334 against Pakistan in 1998 and Donald Bradman’s 334 against England in 1930, before Paine decided to unleash his bowlers, conscious that rain is forecast for the next two days.
It’s just sunk in to me that it is very rare that you get these opportunities... I’ll cherish this moment for the rest of my life, definitely.
David Warner
Australia batsman
HIGHEST SCORES