& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Argentina battle back in 2-2 draw

Afp, Dortmund
Lionel Scaloni praised his . ( battling Aigentina side,
missing Lionel Messi, as they scored second-half goals to earn a 2-2 draw in a friendly against an experimental Germany team on Wednesday.
The Germans flew into a 2-0 lead with first-half goals by Serge Gnabry and Kai Havertz in Dortmund before Lucas Alario turned the game when he came on for Argentina with an hour gone. The Leverkusen striker pulled a goal back, then set up Lucas Ocampos for a deserved late equaliser.
"We matured during the game," said Argentina coach Scaloni. "We made two or three mistakes in the first half, but got a grip in the second half, were more patient and we take a lot of positives for the future."
Germany head coach Joachim Loew admitted his side faded after a bright start.
"We wanted to be in the game right from the off, but unfortunately we couldn't hold on for 90 minutes," said Loew.
Loew handed out four debuts in Dortmund. Freiburg defender Robin Koch and striker Luca Waldschmidt started, then Leverkusen forward Nadiem Amiri and Schalke midfielder Suat Serdar came on for second-half debuts.
Despite 13 withdrawals due to either
illness or injury, Germany impressed early against an Argentina team missing Messi, Sergio Aguero and Angel di Maria.
With Messi suspended for comments made at the Copa America, Juventus' Paulo Dybala partnered Lautaro Martinez up front for Argentina. The friendly was a repeat of the 2014 World Cup final, yet Argentina's Manchester United defender Marcos Rojo was the only survivor when the Germans won in Rio de Janeiro.
Rojo partnered Manchester City veteran Nicolas Otamendi in an Argentina defence which crumbled early on. Gnabry put Germany ahead on 15 minutes.
The winger used his pace when Atletico Madrid's Angel Correa lost possession to get in behind the defence to stab the ball past Argentina goalkeeper Augustin Marchesin. When Rojo then lost the ball to Waldschmidt, Gnabry turned provider, using his pace to present Havertz with a simple tap-in on 22 minutes.
However, the South Americans had the best of the second-half, starting when Scaloni put Alario on for Dybala on 62 minutes.
Alario showed his strength in the air to head past Barcelona goalkeeper Marc-Andre ter Stegen four minutes later. The visitors equalised when Alario set up Sevilla's Lucas Ocampos, a second-half replacement for Correa, to blast past ter Stegen five minutes from time