& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

US refiners planning major plant overhauls

REUTERS, Houston
US oil refiners are planning a heavy slate of plant overhauls in the second quarter, with total production this month off 8.5 percent compared with the start of the year, according to data from the US Energy Information Administration.
Early spring and winter traditionally are heavy periods for U.S. refinery maintenance. But refiners are planning more upgrades than usual in the first half of 2019 to avoid fall and winter shutdowns as they prepare to meet coming low-sulfur standards.
This year's maintenance schedule and higher crude prices helped push U.S. gasoline prices to a national average of $2.83 a gallon last week, up 26 percent since the start of the year, according to data from the American Automobile Association. U.S. crude futures rose 32 percent in the first quarter.
International Maritime Organisation (IMO) 2020 is a standard for maritime diesel that takes effect on Jan 1 and is
designed to reduce air pollution. Refiners have been revampingtheirplants to make IMO 2020compliant fuel.
"They will push (winter) turnarounds later into 2020 to take advantage of that margin bump from the switch to IMO 2020," said Susan Bell, a senior associate at energy consultancy IHS Markit.
Most U.S. refiners typically ramp up production of motor fuel during the second quarter to build inventories for the summer driving season. But Bell said an average of 1 million barrels per day (bpd) of crude oil refining capacity could be offline through the second quarter.
Work on refiners’ crude distillation units (CDUs) and catalytic crackers helped send volumes down to 15.85 million bpd in the last week of March, from 17.5 million bpd in the first week of January, the EIA said. CDUs generate feedstocks for fuel processing units such as catalytic crackers.
Among the refiners scheduling major maintenance this month are Valero Energy Corp and BP Plc.
Valero's Memphis, Tennessee, refinery will shut its 65,000 bpd gasoline producing fluidic catalytic cracking unit for a 60-day overhaul the last week of April.
BP is shutting one of two small CDUs at its 413,500 bpd Whiting, Indiana, refinery on Monday for 30 days of work. The Whiting refinery is BP's largest in North America.
Work also is continuing this month on a planned overhaul of the 112,000 bpd gasoline-producing residual catalytic cracking unit at Royal Dutch Shell Plc's 218,200 bpd Norco, Louisiana, refinery. That unit is expected to restart in the first full week of May. Two other major overhauls finished during the switchover between the quarters.
Exxon Mobil Corp recently finished CDU overhauls at two plants: its 560,500 bpd Baytown, Texas, refinery wrapped up work on its largest CDU in late March and the company's 502,500 bpd Baton Rouge, Louisiana, refinery restarted its second-largest crude unit on Monday.