& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

'Vote Robbery'

CEC remark proves BNP's claim true

Says Rizvi

UNB, Dhaka
The BNP has claimed that its allegation of "vote robbery" in the December 30 national election has now been proved to be true with the CEOs comment that the use of EVMs can prevent stuffing of ballot boxes the night before an election.
"The chief election commissioner has said the risk of stuffing ballot boxes the night before the voting will be reduced if EVMs are introduced. The truth about the election has started to emerge," BNP Senior Joint Secretary General Ruhul Kabir Rizvi said yesterday.
Speaking at a press conference at the BNP's Nayapaltan central office, he said Chief Election Commissioner KM Nurul Huda could not hide the truth for long. "The CEC's slip of tongue has revealed the truth regarding the midnight election. His remark has demonstrated that the election was held at midnight as EVMs were not used."
Addressing a training workshop of election officials at the city's Nirbachan Bhaban on Friday, the CEC had said the Election Commission was planning to use electronic voting machines to make sure that ballot boxes could not be stuffed on the night before an election.
Since the national election, the BNP and Jatiya Oikyafront have been accusing the Awami League of carrying out "vote robbery" by stuffing ballot boxes on December 29 midnight.
Stating that snatching people's voting rights was tantamount to robbery, Rizvi said the CEC "committed a serious offence by holding a midnight election only to keep the current government in power illegally”.
“Your [CEC] remarks will remain as an important document to people about how a chief election commissioner allowed stuffing ballot boxes at midnight in a national election, depriving people of their voting rights.”
The BNP leader questioned whether the CEC allowed the ruling party to stuff ballot boxes on the night of December 29 to justify the use of EVMs that were procured by spending crores of public money.
Rizvi warned the CEC that he would have to be accountable to people some day for the midnight voting.
He said the CEC was trying to use EVMs in the election as spending crores of taka was involved in it. "No machine is required for ensuring a fair election, as only sincerity and commitment to democracy is enough for it. ”
Not only the CEC, but also an election commissioner carelessly talked about the midnight voting as the truth cannot be hidden, the BNP leaderadded.
Rizvi voiced deep concern as ailing BNP Chairperson Khaleda Zia was yet to be taken to hospital for treatment.
He demanded the government shift her to United Hospital for ensuring her proper treatment.