& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Real overtake Atletico with derby victory

Reuters, Madrid
Real Madrid barged their way back into the Spanish La Liga title race with a 3-1 victory over Atletico Madrid in a feisty derby at the Wanda Metropolitano on Saturday. Casemiro, Setgio Ramos and Gareth Bale's strikes inflicted Atletico's first home defeat of the season across all competitions and moved the European champions up to second, within five points of leaders Barcelona, as their revival under Santiago Solari continued.
Antoine Griezmann equalised for Atletico after Casemiro's overhead kick sent Real ahead, but Ramos slammed home from the penalty spot before halftime to silence the home fans.
Atletico's Alvaro Morata netted a brilliant lob against his former side but it was ruled out for offside before Bale drilled in the visitors' third to secure the points for Real Madrid.
Thomas Partey was dismissed after getting his second yellow card at the end of a disappointing afternoon for Diego Simeone's side, who dropped to third after losing for the second weekend in a row.
" La Liga is there to fight for, there are a lot of points to win and any team can make
your life hard,' Real captain Ramos said.
"Winning the league motivates us, it's a really balanced competition and we have to keep fighting for it and making life difficult for Barcelona."
A vibrant atmosphere at the Wanda Metropolitano also carried an undercurrent of anger as Atletico fans threw stuffed toy rats at Thibaut Courtois's goal.
It was the Belgian goalkeeper's first return to play his former side Atletico since signing for Real Madrid and he endured an uncomfortable afternoon.
Atletico started brightly with Griezmann firing into the side netting but Real moved ahead in the 16th minute when Casemiro scored a spectacular overhead kick after a corner was flicked on to him.
Atletico levelled when Griezmann slotted home coolly through Courtois's legs after Correa played him in.
The VAR system was referred to when Jose Gimenez brought down Vinicius on the edge of the box, with referee Xavier Fernandez deciding the foul continued into the area.
Ramos smashed home from the spot to send his side back into the lead just before halftime and Bale netted the third to seal an impressive victory.