& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Five wins in a row for Solskjaer

AFP, London
Ole Gunnar Solskjaer enjoyed a fifth successive win in as many games as interim manager of Manchester United when his । side beat Reading 2-0 in the third round of the FA Cup at
OldTrafford on Saturday.
The former United striker had already guided the Red Devils to a run of four straight Premier League victories since being appointed coach after controversial former boss Jose Mourinho was sacked last month.
That winning sequence was maintained against second-tier strugglers Reading, with the third round marking the entry into the FA Cup, the world's oldest senior knockout football competition, of England's topflightclubs.
United, last season's losing finalists, were 2-0 up before half-time, thanks to goals from Juan Mata and Romelu Lukaku but Reading had their chances against a still suspect defence.
Mata gave United, 12-times winners of the Cup, the lead in unusual fashion in the 22nd minute.
United initially had a goal disallowed for offside against Fred but referee Stuart Attwell, after a lengthy consultation with the
video assistant referee, awarded the home side a penalty for a foul on Mata in the build-up.
The Spanish midfielder then scored from the spot himself, sending Reading goalkeeper Anssi Jaakkola the wrong way.
Alexis Sanchez and Lukaku were both making their first United starts under Solskjaer and the pair combined to make it 2-0 deep into stoppage time at the end of the first-half.
From Sanchez's through-ball, the onrushing Lukaku calmly rounded Jaakkola and scored from a tight angle.
Elsewhere, an all-Premier League clash saw Brighton win 3-1 away to south coast rivals Bournemouth.
Brighton, beaten in a replay by United in the 1983 FA Cup final, scored with what amounted to their first attack of the game when Anthony Knockaert fired them into a 31st-minuted lead.
And three minutes later it was 2-0, when Yves Bissouma's long-range shot went in off the post.
Bournemouth pulled a goal back through Marc Pugh's fine effort from 20 yards out but Brighton restored their two-goal lead in the 64th minute when Florin Andone headed in from the Seagulls' first corner of the game.