& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Farhad toys with Central batsmen

Sports Reporter
While there has been plenty of noise about whether the national team management's ploy of employing an all-out spin attack in Tests is discouraging pacers in the country, the green top at the Shaheed Chandu Stadium in Bogura has provided some good news for them.
Fast bowlers continued to exploit the pacefriendly pitch in Bogura as East Zone's mediumpacer Farhad Reza bowled career-best figures of 7-32 to wrap up Central Zone for 118 runs on the opening day of the third round of the Bangladesh Cricket League yesterday.
The 32-year old eclipsed his previous best 6-54 on way to securing an eighth five-wicket haul after Abu Jayed - who took two wickets - opened the floodgates by removing Pinak Ghosh.
In a second round match at the same venue, Ebadat Hossain, Shahidul Islam and Mohor Sheikh had run riot on the green pitch.
Marshall Ayub, the Central Zone batsman who made a duck, praised Farhad for his good bowling but added that the wet pitch made the job difficult for batsmen.
"You know the pitch was wet as there was no sunshine and because of that it was impossible for the batsmen to survive on such a green top surface. But Farhad deserves praise for the way he exploited the conditions, “ said the right-hander.
Pacer Shahadat Hossain scalped the lone East Zone wicket before bad light halted the day's play.
At the Zahur Ahmed Chowdhury Stadium in Chattogram, pacer Ebadat made somewhat of an impact but it was left-arm spinner Sunzamul Islam's four-wicket haul that saw South Zone finish the day at 280 for nine against North Zone.
South rode on half-centuries from Tushar Imran, who hita 146-ball 62, and Rakibul Hasan, who scored a 146-ball 79, to reach a respectable first innings total.
SCORES IN BRIEF
CENTRAL ZONEVEAST ZONE
CENTRAL ZONE: 118 all out in 55 overs (Rakin 14, Pinak 21, Taibur 14, laker 20 not out, Sharifullah 23; Jayed 2-33, Ifran 1-26, Farhad 7-32)
EAST ZONE: 37-1 in 14 overs (Rony 18, Shamsur 9 not out, Mahmudul 9 not out; Shahadat 1-25)
SOUTH ZONEV NORTH ZONE
SOUTH ZONE: 280-9 in 90 overs (Anamul 19, Fazle 45,Tushar 62, Rakibul 79, Mahedi 23 not out; Ebadat 2-41, Sunzamul 4-62)