& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Indian EC makes strong case for EVM

Our Correspondent, New Delhi
India's Election Commission yesterday sought to dispel apprehensions among opposition parties about Electronic Voting Machines (EVM) saying they are "absolutely tamperproof".
The statement comes ahead of the legislative assembly elections to be held in five states in November-December and parliamentary polls next year.
Making a strong defence for EVMs over ballot papers, the EC said in a statement that the use of EVMs "has ended the days of booth-capturing and delays and errors in counting of ballot papers.”
"There have been instances of invalid votes being higher than even the winning margin in several elections," the EC added, noting the
FROM PAGE 2
negative sides of paper ballots.
"The EVMs and WPATS (Voter Verifiable Paper Trail) being used in the Election Commission of India are manufactured only at the two premium public sector undertakings - Electronics Corporation of India Limited (ECIL) and Bharat Electronics Limited (BEL) -under the technical expertise of an independent Technical Expert Committee and supervision of the Election Commission, making them absolutely tamper proof," the commission said.
EVM and WPAT inventory "is securely managed through a robust tracking system to track all operations on machine movement, first-level checks, randomisation and poll- day defects", itadded.
The Indian EC said it was making all the arrangements to ensure EVM and WPAT allocation well in time for the assembly elections across the five states.
It said mandatory training to district officers was also being ensured to meet the requirement to use WPATs across approximately 10.6 lakh polling stations for the upcoming national election in 2019.
The poll body said it has been consistently reviewing the status of production and supply of EVMs and WPATs with the EClLandtheBEL
Around 22.3 lakh ballot units, 16.3 lakh Control Units and nearly 17.3 lakh WPATs will be used for the elections in
2019, itadded.
Till date EVMs have been used in India in 113 elections to state assemblies and three parliamentary polls since2000.
"Addition of Voter Verifiable Paper Audit Trail (WPAT) to the EVM has helped strengthen the voters' trust and transparency of the voting process," the Commission said.
A WPAT is an independent printer system attached with the Electronic Voting Machines (EVM) that allows the voters to verify that their votes are cast as intended. WPAT slips will be visible to the voter for seven seconds behind the transparent screen of WPAT, before falling into the sealed compartment at the base of the machine.
The Commission said the specially-designed thermal paper to be used in the WPAT is capable of retaining the printout for more than five years so that it is available for manual verification by the Court if required in the event of a dispute for cross checking the counting of votes cast.
So far, WPATs have been used in 933 state assembly constituencies and 18 parliamentary constituencies, the ECsaid.
The Commission on Saturday announced the schedule of assembly elections in five states - Rajasthan, Madhya Pradesh, Chhattisgarh, Telangana and Mizoram.