& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Pique rescues 10-man Barca

AFP, Barcelona
American fans will be lick-ing their lips if this is what awaits Miam's Hard Rocl< . Stadium in January after LOLlQO Barcelona and Girona played out an enthralling 2-2 draw at the Camp Nou on Sunday.
There were four goals, one for Lionel Messi and two for Girona's Cristhian Stuani, not to mention a controversial red card shown to Barca defender Clement Lenglet.
Gerard Pique salvaged a point for the hosts to complete his own blockbuster night, after clearing one shot off the line and making mistakes for each of Girona's goals.
By the end, Barca had surrendered theirperfect record in La Liga, as well as a two-point advantage over Real Madrid. They return to the top of the table, but only on goal difference. Girona move up to sixth.
"For us, this is a triumph," Stuani said. "Coming here and getting this result is so valuable for us.'
Hanging over this game was always the wider prospect of it not being returned, given La Liga's desire to move the reverse fixture at Girona's Estadi Montilivi on January 26 to the United States.
A point may not be viewed as a bad return either for Barca, having played through the best part of an hour with 10 men, but changes made by coach Ernesto Valverde failed to hit the mark.
Lenglet came in for Samuel Umititi,
presumably to bed in next to Pique, given Umtiti is suspended for Barcelona's Champions League game against Tottenham later this month.
But he was, perhaps harshly, sent off in the 35th minute with Barca one up, and they then conceded before Umtiti came on at half-time. Arthur and Arturo Vidal - also brought in - were substituted before the hour.
"When we got the red card, our intention was to make a change but we had to let him (Umtiti) warm-up," Valverde said. "It looks like an error on my part."
Messi and Pique had changed too, each shaving their beards, but it had contrasting effects based on the evi-
dence of the first half.
Within 19 minutes, Messi had put Barca ahead, a slick finish into the comer finishing off Vidal's pass for the Argentinian's eighth goal in six games.
Pique, however, was at fault for the equaliser, a lethargic attempt at a clearance allowing Stuani to poke the ball past Marc-Andre ter Stegen.
Girona had been spurred on by Lenglefs red card, after VAR showed the French defender landed an elbow into the face of Pere Pons, and referee Jesus Gil deemed it deliberate.
The red card rippled through the French contingent as Lenglet's dismissal meant Ousmane Dembele was replaced by Umtiti at half-time.