& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

The mystery of Giza pyramid

Mail Online
The remarkable electromagnetic properties of the Great Pyramid of Giza could soon inspire nanoparticle designs for highly-efficient sensors and solar cells.
Scientists have discovered the
famous pyramid concentrates electric and magnetic energy into its internal chambers and below its base, creating pockets of higher energy.
If this concentrating effect is able to be recreated on a nanoscale size, it could lead to a wave of new, more efficient sensors and solar cells, the researchers claim.
While the 481-foot pyramid constructed thousands of years ago for Pharaoh Khufu has long drawn intrigue for its purported mythical qualities, the study is among a growing body of research that attempts to finally get to the bottom of its physical properties.
"Egyptian pyramids have always attracted great attention," says Dr Andrey Evlyukhin, scientific supervisor and coordinator of the research.
"We as scientists were interested in them as well, so we decided to look at the Great Pyramid as a particle dissipating radio waves resonantly."
The international research team looked into the relationship between the shape of the Great Pyramid of Giza and its ability to focus electromagnetic energy.
To do this, the team led by ITMO University in Saint Petersburg, Russia, created a model of the pyramid, one of the seven wonders of the ancient world, to accurately measure its electromagnetic response.
The researchers used the model to see how wave energy is scattered or absorbed by the pyramid. They tested the interactions with waves of resonant length, ranging from 200 to 600 metres (656ft to 1,968ft).
However, due to the lack of reliable information about the properties of the pyramid, the team was forced to fill-in the blanks for some factors of their model.
"We had to use some assumptions," Evlyukhin admitted. "For example, we assumed that there are no unknown cavities inside, and the building material with the properties of an ordinary limestone is evenly distributed in and out of the pyramid.
"With these assumptions made, we obtained interesting results that can find important practical applications."
This includes the two chambers believed to have contained the remains of Pharaoh Khufu and his wife, as well as the third unfinished chamber buried beneath the base.
The Ancient Egyptians that built the pyramids more than 4,400 years ago were not aware of this quirk of design.