& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Laos Dam Collapse

Hundreds missing

Many feared dead; more than 6,000 people left homeless

AFP, Bangkok
Hundreds are missing and an unknown number feared dead after a partly built hydropower dam in southeast Laos collapsed after heavy rain and sent a wall of water surging through six villages, state media and contractors said yesterday.
Laos News Agency said the accident happened on Monday evening near the border with Cambodia, releasing five billion cubic metres of water — more than two million Olympic swimming pools.
The agency said there were "several human lives claimed, and several hundreds of people missing" while some 6,600 people had been made homeless as authorities scrambled to evacuate villagers.
Communist Laos is traversed by a vast network of rivers and several dams are being built or planned in the impoverished and landlocked country, which exports most of its hydropower energy to neighbouring countries like Thailand.
Aerial footage posted on the Facebook page of local news outlet ABC Laos showed a vast brown inundation swamping houses and jungle alike over a huge area.
Anothervideo showed families waiting for rescue on the rooftop of their house, with a nearby Buddhist temple partially submerged.
Nearly 24 hours after the collapse local authorities said they were struggling to gauge the extent of the disaster.
"We do not have any formal information yet about any casualties or how many are missing," an official in Attapeu province, where much of the flooding occurred, told AFP on condition of anonymity, adding that was no phone signal in the flooded region.
"We sent rescue teams who will help them and provide basic assistance first," the official added.
The Thai government said it would also send rescue experts to its northern neighbour.
HEAVY RAINFALL
The $1.2 billion dam is part of a project by Vientiane-based Xe Pian Xe Namnoy Power Company, or PNPC, a joint venture formed in 2012 between a Laotian, a Thai and two South Korean companies, according to the project's website.
Ratchaburi Electricity Generating Holding, the Thai company, said it had been told by operators that a 770-metre-long auxiliary dam used to divert river water had failed after heavy rainfall.
"The incident was caused by continuous rainstorm which caused high volume of water to flow into the project's reservoir," itsaid in a statement.
One of the South Korean compa-nies, SK Engineering and Construction, said it had sent a crisis team to Laos, according to Yonhap news agency, and was bringing in helicopters from Thailand.
South Korea's foreign ministry said another Korean firm, Korea Western Power, was also involved. The companies and others had sent helicopters, boats and rescue workers.
"All of our 53 nationals who were taking part in this construction evacuated in advance," the ministry said in a statement.
Pope Francis said in a Vatican message he had learned with sadness of the loss of life, and expressed "hertfelt solidarity" with all those affected.
The 410 megawatt capacity plant was supposed to start commercial operations by 2019, according to the venture's website.
The project consists of a series of dams over the Houay Makchanh, the Xe-Namnoy and the Xe-Pian rivers in Champasak Province.