& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Kerber stops Serena's bid

Becomes first German since Graff to win Wimbledon title

AFP, London
Angelique Kerber became the first German woman to win Wimbledon for 22 years as the 11th seed shattered Serena Williams' bid
for Grand Slam history with a shock 6-3, 6-3 victory in Saturday's final.
Kerber avenged her defeat against Williams in the 2016 Wimbledon title match, overwhelming the seven-time champion with a stunning 65-minute upset on Centre Court.
" I knew I had to play my best tennis against a champion like Serena," Kerber said.
“It was my second chance to play in the final. I think I'm the next one after Steffi who won. That's amazing."
Williams had hoped to equal Margaret Court's record of 24 Grand Slam singles titles by winning her first major prize since becoming a mother in September.
The 36-year-old went into the final as the title favourite, even though she was playing only the fourth tournament of her post-pregnancy comeback.
But instead world number 10 Kerber sprang a huge surprise, making her
Germany's first female champion at the All England Club since Steffi Graf in 1996.
“It's obviously disappointing but I am just getting started," said an emotional Williams after losing in the Wimbledon final for the first time since 2008.
Back to her best on the grass at Wimbledon, kerber needed only 11 winners and one ace to deny an oddly nervous Serena, who contributed to her own downfall with a whopping 24 unforced errors, compared to only five from Kerber.
In the first Wimbledon final for 41 years to feature two women 30 or older, Serena was cheered on by her friend the Duchess of Sussex, golf legend Tiger Woods and Formula One ace Lewis Hamilton.
Serena's 30th Grand Slam final got off to a rocky start as she dropped her serve with four unforced errors in the opening game.
She briefly hit back, breaking to love in the fourth game, but then produced another error-strewn effort, including two double faults, to gift a 4-3 lead to Kerber.
Although Williams was on a 20-
match winning run at Wimbledon and had lost only one set en route to the final, she was completely out of sorts, spraying wild ground-strokes wide time and again.
Kerber, cleverly moving Serena into awkward positions, took full advantage, winning four games in a row to wrap up the set.
The 11th seed knew what it took to beat Serena in a Grand Slam showpiece after winning their 2016 Australian Open final.
She kept nagging away at Serena and induced more miscues from the American in the sixth game of the second set.
On break point, the left-hander landed the knockout blow with a fierce forehand winner down the line that left Williams grasping in vain to reach it
When Williams made another mistake to lose the next game, she gestured to her coaching team with a look of depair.
Her agony only increased with a woeful volley that flew long to put Kerber within two points of the title.
Moments later, Serena's misery was complete as a tame return left Kerber wiping away tears of joy.