& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Sterilised mosquito to fight dengue

AFP, Sydney
More than 80 percent of a dengue fever-spreading mosquito has been wiped out in an Australian town during a landmark trial scientists said yesterday offered hope for combating the dangerous pest globally.
Researchers from Australia's national science body CSIRO bred millions of non-biting male Aedes aegypti mosquitoes in laboratory conditions at James Cook University (JCU) in a project funded by Google parent company Alphabet.
The insects were infected with the Wolbachia bacteria, which renders them sterile.
They were then released into the wild at trial sites around the Queensland town of Innisfail where over three months they mated with females who
laid eggs that did not hatch, causing the population to plummet.
The Aedes aegypti mosquito is one of the world's most dangerous pests, capable of spreading devastating diseases like dengue, Zika and chikungunya.
It is responsible for infecting millions of people around the world each year and JCU's Kyran Staunton said the successful trial was a major step forward.
"We learnt a lot from collaborating on this first tropical trial and we're excited to see how this
approach might be applied in other regions where Aedes aegypti poses a threat to life and health," he said.
The so-called sterile insect technique has been used before but the challenge in making it work for mosquitoes was being able to rear enough of them, identify males, remove biting females, and then release them in large enough numbers to suppress a population.
To address the challenge, Verily -- a life sciences company funded by Alphabet -has developed a mosquito rearing, sex sorting and release
technology as part of its global Debug project.
"We're very pleased to see strong suppression of these dangerous biting female Aedes aegypti mosquitoes," Verily's Nigel Snoad said.
"We came to Innisfail with CSIRO and JCU to see how this approach worked in a tropical environment where these mosquitoes thrive, and to learn what it was like to operate our technology with research collaborators as we work together to find new ways to tackle these dangerous mosquitoes."