& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Rabada puts SA on top

AFP, Port Elizabeth
South African fast bowler Kagiso Rabada ripped the heart out of Australia's
batting when he took four wickets in seven balls on the first day of the second Test on Friday.
Rabada added a fifth wicket in the same spell as Australia were bowled out for 243 after winning the toss and batting on a green-tinged pitch on an overcast day at St George's Park.
South Africa were 39 for one at the close.
Rabada finished with five for 96, having done all his damage on either side of tea, taking the key wicket of Australian captain Steve Smith, then following up by dismissing the Marsh brothers, Shaun and Mitchell, in his next over.
Tea was taken after Mitchell Marsh
was out. With his remaining ball in the over, Rabada had Pat Cummins caught behind to be on a hat-trick. He didn't manage that but 11 balls later he bowled Mitchell Stare.
It was a day of contrasts. Australian opening batsmen Cameron Bancroft and David Warner survived a testing first hour, scoring only 23 runs in 14 overs, then seemed to have taken control as they added 75 runs in the next hour, only for Bancroft to be out for 38 off the last ball before lunch.
Two more wickets fell quickly after the interval, including that of Warner for 63, made off 100 balls with nine fours.
Warner had at least let his bat do the talking after a week punctuated by the fallout from his altercation with South African wicketkeeper Quinton de Kock during the first Test.
Smith and Shaun Marsh steadied the innings with a patient fourth wicket stand of 44 before Rabada started his
devastation.
Rabada produced a fest delivery angled in to the stumps to strike Smith on the back pad. Smith failed in a review of umpire Kumar Dharmasena's decision.
In Rabada's next over Shaun Marsh was beaten by a ball which swung into his pads and was also leg before. Mitchell Marsh edged a four but then was caught behind off an inside edge
Australia were 182 for eight when Stare was out but wicketkeeper Tim Paine batted well with the last two batsmen, Nathan Lyon and Josh Hazlewood as the last two wickets added 61 runs. Paine was last man out for36.
SCORES IN BRIEF
AUSTRALIA: First innings 243 (Bancroft 38, Warner 63, Smith 25, Marsh 24, Paine 36; Philander 2-25, Rabada 5-96, Ngidi3-51)
SOUTH AFRICA: First innings 39 for 1 (Elgar 11 notout, Rabada 17 not out 17, Cummins 1-9)