& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Australia rally in fading light

AFP, Durban
David Warner and Steve Smith hit half-centuries but Australia were unable to dominate South Africa's bowling attack on the first
day of the first Test at Kingsmead on Thursday.
Australia, who won the toss and batted on an easy-paced pitch, were 225 for five when bad light ended play four overs before the second new ball was due.
With no assistance for the bowlers from a slow surface, South Africa bowled with discipline to keep the batsmen in check.
Apart from a bright third-wicket partnership of 56 off 92 balls between Warner (51) and Smith (56), it was largely attritional cricket between the second and third-ranked teams inTest cricket.
Vernon Philander bowled with excellent control to take two for 36, while left-arm spinner Keshav Maharaj took two for 69. It was an indication of the slowness of the pitch that Maharaj bowled 24 of the 7 6 overs sent down in the day.
Smith made his fifth consecutive score of 50 or more as he continued the form he showed in the Ashes series against England in which he scored 687 runs at an average of 137.40.
The Australian captain gave a half-chance on 47 when AB De Villiers at second slip could not hold a sharp, low catch to his left off Philander. He faced 114 balls and hit 11 fours in his innings.
He had made 24 off 44 balls in his partnership with Warner, who was caught at second slip off the last ball before lunch, but was restricted after the interval as the South African bowlers worked hard to force him to play on the off side instead of his favoured leg side.
Smith showed some signs of frustration before he cut a ball from Maharaj which bounced off
wicketkeeper Quinton de Kock's gloves to De Villiers at slip.
Maharaj struck again when he switched ends after tea and with his fourth ball of a new spell had Shaun Marsh caught at slip for a patient 40.
Marsh had a let-off on 19 when a yorker from Kagiso Rabada struck him low down and would have hit his leg stump, according to television replays. Umpire Kumar Dharmasena gave him notout.
South Africa had used up both of their reviews - also involving leg before wicket decisions by
Dharmasena - and could not challenge.
South African hopes of pressing home their advantage were foiled by Mitchell Marsh and Tim Paine, who added an unbeaten 48 before the umpires took the players off the field.
SCORES IN BRIEF
AUSTRALIA: First innings 225 for 5 (Warner 51, Smith 56, S Marsh 40, M Marsh 32 not out, Paine 21 notout; Philander2-36, Maharaj 2-69) SOUTH AFRICA: Du Plessis, Elgar, Markram, Amla, De Villiers, De Kock, De Bruyn, Philander, Maharaj, Rabada, M Morkel.