& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Conte calm despite huge defeat

AFP, London
Chelsea
Premier manager Wfl’ League Antonio w Conte said he will lose no sleep over the threat he could be sacked less than a year after winning the Premier League following a 4-1 thrashing at Watford on Monday.
The champions have now conceded seven goals in their last two outings after also going down 3-0 at home to Bournemouth last week to put their chances of Champions League qualification for next season in serious peril.
“Tomorrow is another day. I can be the Chelsea coach or not, what is the problem?” said Conte. "I go to sleep without a problem.
"I try to do everything and, if this is
enough ok, otherwise the club take a different decision. The life goes on."
Defeat leaves Chelsea still lagging in fourth and just a point ahead of fifth-placed Tottenham Hotspur,
Conte has repeatedly complained throughout the campaign at his lack of input towards the club's recruitment strategy and once more the Italian lined up without a recognised striker at Vicarage Road with Alvaro Morata sidelined by injury and Olivier Giroud fit enough only for the bench.
However, Conte also delivered some stinging criticism to his players, who he said "played with fear".
"I try to continue to work to try to improve different aspects of my players, but today I think our performance was very poor," added Conte.
" For sure I have to take the responsibility because maybe I made the
wrong decision forthestartingXI.
"To play football in a big club it means you must have personality. It is simple to play when there is the confidence. In this type of moment you can see who is (made) for a great club, to play with personality."
Chelsea's task wasn't made any easier when Tiemoue Bakayoko was sent-off after just half an hour for two quickfire bookable offences.
And Conte was particularly annoyed with his side's reaction in the closing stages as they conceded three times in the final six minutes.
" In the second half I saw great desire, but a lot of confusion. We were able to draw and I think in that moment we must be good to manage the situation, to understand the moment.
"A great team must do this, instead