& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Federer eases into final

AFP, Melbourne
Defending champion Roger Federer strolled into the Australian Open final in a bitter-sweet win after Chung Hyeon's retired injured in theirsemifinal on Friday.
The Swiss star was leading 6-1, 5-2 when the South Korean called it quits with foot blisters and will now face Marin Cilic in Sunday's final.
Chung, the first South Korean man or woman to play in a Grand Slam semifinal, was treated in a medical timeout for the left foot problem two games earlier.
But it came as a big surprise when the 21 -year-old walked to the net at SOSO and trailing 2-5 after Ihr 02mins in the second set to concede defeat.
It put Federer into his seventh Australian final as he chases his sixth Melbourne title and 20th Grand Slam
victory.
Federer leads 2014 US Open champion Cilic 8-1 in their meetings.
The Swiss maestro now has a 30-13 win-loss record in Grand Slam semifinals and has yet to drop a set in this year's Australian Open.
"You couldn'ttell until the end," he said of Chung's injury problems. "That's probably why a lot of people are stunned (he retired).
"I could tell something was wrong before he took the injury timeout, but he has a great composure.
"I think he is already a great player, but we are talking next level excellence and I think he will achieve that.
"We will see much more of him.
Top 10 for sure. The rest we will see."
It was a muted semi-final with the Rod Laver Arena retractable roof closed for rain further improving Federer's chances given his indoor record.
He broke Chung's opening service
and twice more to romp away with the first set in just 33 minutes as the Korean made a flurry of errors.
It got no better in the second set with Federer again breaking in the fourth game before the trainer was called on to the court to treat Chung for his foot blisters.
Chung only lasted a bit more than two games before pulling out to a stunned silence.
"In the second set I felt he was starting to get a bit slower, fighting with a blister," Federer said.
"I've played with blisters in the past a lot, and it hurts a lot, and at one point it is just too much and you can't take it anymore.
"That's when you realise there is no way you can come back and you make things really worse, it is better to stop. That's why this feels bitter-sweet.
"Obviously I'm incredibly happy to be in the finals, but not like this."