& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

England fight back

AFP, Birmingham
England captain Alastair Cook and Alex Hales's first century stand as an opening pair left the third Test against Pakistan at Edgbaston intriguingly poised come the
close of Friday's third day.
At stumps, England were 120 without loss in their second innings, a lead of 17 runs.
Cook was 64 not out and Hales 50 not out, with two days left in the match.
England were 103 runs behind on first innings after more than 10 hours in the field.
Yet Hales was soon into his stride with a cover-driven four off left-arm quick Mohammad Amir.
Meanwhile Cook took advantage of width from Sohail Khan with two square-cut boundaries in three balls.
Cook completed a brisk fifty in 67 balls when Rahat All's misfield at mid-on saw a drive by the lefthander go for his fifth four of the innings.
Hales took England into the lead with an elegant back-foot forcing shot through the covers off Sohail, who had marked his return to Test cricket by taking five for 96 in the hosts' first innings.
And the last delivery of the day saw Hales complete a 116-balI fifty with a single off the tiring Sohail.
Pakistan were bowled out for 400 in reply to England's first innings 297 on the stroke of tea.
After Azhar Ali, whose 139 was his first Test century outside Asia, and recalled 20-year-old opener Sami Aslam (82) put on 181 for the second wicket Thursday, Pakistan saw skipper Misbah-ul-Haq (56) and wicket-keeper Sarfraz Ahmed (46 not out) frustrate England on Friday.
Chris Woakes led England's attack with three for 79, while fellow paceman
Stuart Broad took three for 83.
Pakistan resumed on 257 for three after Azhar had been dismissed off the last ball of Thursday’s play.
Younis Khan was joined in the middle by fellow veteran Misbah. Woakes, who had dismissed Azhar, struck again when he had Younis caught behind for 31 down the leg side.
It took the patient Misbah 40 balls to score his first boundary, but he broke the drought with two boundaries in three balls off Broad, courtesy of a pair of well-struck drives, one through the covers and the other down the ground.
Broad though found his range when a full-length delivery smashed into Asad Shafiq's off stump for an 18-ball nought to leave Pakistan 296 for five, still one run behind.
Misbah's single to third man off Broad saw Pakistan into the lead.
Pakistan's batsmen have found Moeen Ali to their liking this series and Misbah reverse-swept him for four when the off-spinner came on before lunch.
Wicket-keeper Ahmed followed up with two swept fours in as many balls off Ali, whose 17 wicketless overs cost 79 runs.
After lunch Misbah posted his third fifty this series when he drove James Anderson for a sixth four in 93 balls.
But on 56 he was bowled by Anderson to end a stand of 62 with Ahmed.
The first ball of Anderson's 30th over saw him barred from bowling in the rest of the innings after he received a third warning from West Indian umpire Joel Wilson for running on the pitch, having been given two such cautions by Australia's Bruce Oxenford on Thursday.
Pakistan were then 368 for eight.
After Pakistan's tenthwicket pair had extended the lead beyond 100, last man Rahat nicked Broad to Joe Root in the slips.