& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Real go four clear

Agencies, Madrid
Real Madrid moved four points clear of Barcelona at the top of La Liga with a 2-0 win at Elche on Sunday.
After passing up a host of chances in the first-half, Madrid finally made the breakthrough when Karim Benzema tapped home from close range 11 minutes into the second period.
Cristiano Ronaldo then sealed the three points when he bulleted home a header from Isco's pin-point cross 21 minutes from time.
The Portuguese now has 290 goals and is level with Carlos Santillana, while Raul is out in front on 323.
Boosted by Barca's shock 1-0 defeat to Malaga on Saturday, Madrid started brightly and should have been well in front by halftime.
Gareth Bale had an early strike ruled out for offside before Ronaldo smashed an effort from 20 yards off the post.
The World Player of the Year then passed up a huge chance when he miscued with the goal gaping from Bale's low cross.
Another effort from Ronaldo, this time with his head from Toni Kroos's free-kick, flew just wide as the pressure built.
And the visitors were unfortunate not to be ahead in stunning fashion when Benzema's overhead kick was also chopped
off for the tightest of offside calls.
Madrid captain Iker Casillas was making his 500th La Liga appearance, but had barely touched the ball until he had to make a smart low save to his right to deny Aaron Niguez two minutes after the break.
Niguez was lucky to stay on the pitch moments later when he only saw a yellow card for a horrific challenge on Bale that fortunately the Welshman was able to shake off.
Carlo Ancelotti's men finally got the break that had deserted them early in the game on 56 minutes when David Lomban's clearance from Ronaldo's low cross bounced off Elche 'keeper Przemyslaw Tyton and into the path of Benzema to slot into an empty net.
Ronaldo then ended his three-game goalless streak in La Liga with a wonderful header from Isco's fine cross to put the game to bed.
Earlier, David Moyes's Real Sociedad struck twice in the final 10 minutes to come from behind and seal a thrilling 4-3 win over Sevilla at Anoeta.
The hosts had got off to an ideal start as Imanol Agirretxe slotted home the opener after 16 minutes, but Timothee Kolodziejczak levelled for the Europa League holders before the break.
Sociedad were then gifted a soft penalty at the start of the second period, which Xabi Prieto converted, but Sevilla responded once more when their top scorer Carlos flicked home Ever Banega's free-kick.