& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

MU, Liverpool on the move

Afp, London
Steven Gerrard and Juan Mata scored pivotal goals as Liverpool and Manchester United each posted victories over obdurate opposition in the Premier League on Tuesday.
Gerrard, the subject of speculation about his Anfield future this week, stroked home the crucial second goal as Liverpool came from behind to win 3-1 at 10-man Leicester City.
Victory lifted Brendan Rodgers's side up to eighth place, but they remain five points off the Champions League berths after Mata's fortuitous strike earned fourth-place United a 2-1 success at home to Stoke City.
The Spaniard saw a free-kick from wide on the right drift straight into the net in the 59th minute at Old Trafford, sending United to within a point of third-place Southampton, who visit Arsenal on
Wednesday.
Leaders Chelsea entertain Tottenham Hotspur on Wednesday, while second-place Manchester City travel to Sunderland.
Gerrard, 34, was recalled to Liverpool's starting XI after starting Saturday's 1-0 win over Stoke on the bench, but his return did not spare the visitors from a wobbly start at the King PowerStadium.
Esteban Cambiasso should have put Leicester ahead in the 20th minute when under-fire Liverpool goalkeeper Simon Mignolet played the ball straight to him, only for the Argentine midfielder to roll the ball wide.
But Leicester went ahead two minutes later, with Leonardo Ulloa's shot hitting the post and cannoning into the net off Mignolet's back for an own goal after Martin Skrtel had blocked on the line from JamieVardy.
The hosts' lead lasted just four minutes, however, with Adam Lallana drilling home
an equaliser from Rickie Lambert's knockdown.
Gerrard’s moment arrived nine minutes into the second period. Wes Morgan could only get a toe to Raheem Sterling's low leftwing cross and Gerrard strode forwards to bend the loose ball into the bottom-right corner.
After Morgan was sent off in the 63rd minute for hauling back Lambert, Sterling's back-heel teed up Jordan Henderson to sweep home a late third for Liverpool after a fumble by home goalkeeper Kasper Schmeichel.
A knee injury to Wayne Rooney saw 19-year-old James Wilson handed a surprise start for Manchester United, who took a 21 st-minute lead when Marouane Fellaini headed in Ander Herrera's inviting leftwingcross.
Steven Nzonzi equalised for Stoke six minutes before half-time, lashing home from outside the box after adartbyBojan Krkic.
But Mata's goal gave United a fourth
straight victory, with Marcos Rojo's leap distracting visiting goalkeeper Asmir Begovic and allowing the former Chelsea playmaker's free-kick to nestle inside the left-hand post.
West Ham United remain a point behind Louis van Gaal's side in fifth place after coming from behind to win 2-1 at West Bromwich Albion.