& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Djokovic, Murray move on

AFP, London
Top seed Novak Djokovic and defending champion Andy Murray stormed into the Wimbledon second round Monday with such speed that All England Club organisers had to pad out the Centre Court schedule.
Murray took out baby-faced Belgian, David Goffin 6-1,6-4,7-5 in a shade over two hours while Djokovic, the 2011 champion and runner-up to the third-seeded Briton in 2013, needed just 88 minutes to dispose of Kazakhstan's Andrey Golubev, 6-0, 6-1,6-4.
In between, Li Na, the women's second seed, took only 77 minutes to get past Polish qualifier Paula Kania.
Murray and Djokovic were joined in the second round by Czech sixth seed Tomas Berdych, the 2010 runner-up, who came from a set down to beat Romania's Victor Hanescu, 6-7 (5/7), 6-1,6-4,6-3.
Spanish seventh seed David Ferrer, twice a quarterfinalist, also made it through by seeing off compatriot Pablo Carreno-Busta 6-0, 6-7 (3/7), 6-1,6-1.
Grigor Dimitrov, the Bulgarian 11th seed who won the Queen's title last week, beat Ryan Harrison of the United States, 7-6 (7/1), 6-3,6-2.
But Spanish 18th seed Fernando Verdasco, who took Murray to five sets in the quarterfinals in 2013, was knocked out by Australia's Marinko Matosevic 6-4,4-6,6-4,6-2.
Chinese women's second seed Li Na, a three-time quarter-finalist, got back on track after her French Open misery thanks to a 7-5, 6-2 win over Kania.
Li suffered her worst Grand Slam performance since 2011 when she slumped to an opening round exit against Kristina Mladenovic in Paris.
But the 32-year-old from Wuhan was too strong for world number 183 Kania, hitting 24 winners to set up a
second round meeting with Austria's Yvonne Meusburger.
"In the beginning I was a bit shaky because 1 hadn't played her before and she was using my power against me, so I was really happy to win in the end, “ said Li.
Former women's world number one Victoria Azarenka won her first match since January as the eighth seed triumphed 6-3, 7-5 against Croatia's Mirjana Lucic-Baroni, who was a semi-finalist back in 1999.
The former Australian Open champion has been plagued by a left foot injury which kept her off tour from Indian Wells in March to Eastbourne last week where she lost her opener to Camila Giorgi.
US 18th seed Sloane Stephens, a quarter-finalist in 2013, was defeated by Russian former top 10 player Maria Kirilenko, 6-2,7-6 (8/6).
Kirilenko, who had won just one match all year after a lengthy battle with a knee injury, claimed victory on a sixth match point.