& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Uruguay stunned

AFP, Fortaleza
Costa Rica came from a goal down to beat Uruguay 3-1 in a huge World Cup upset Saturday as the Copa America champions suffered for the absence of star striker Luis Suarez.
After Edinson Cavani gave the South Americans the lead from the penalty spot in the first half, Costa Rica roared back with two goals in three minutes from Joel Campbell and Oscar Duarte.
With Liverpool star Suarez confined to the bench recovering from a knee injury, Costa Rica grabbed a third through substitute Marcos Urena to throw Croup D, which also features England and Italy, wide open.
Uruguay's Maxi Pereira was red-carded in injury time to compound his team's misery. Uruguay had the ball in the net after 15 minutes but Diego Codin's effort was rightly ruled out for offside.
German referee Felix Brych called it right again in the 22nd minute when defender Junior Diaz was penalised for hauling down Uruguay skipper Diego Lugano in the box.
Up stepped Paris Saint-Germain striker Cavani to calmly bury the penalty to the right of Costa Rica goalkeeper Keylor Navas. It was Cavani's 22nd goal in 63 internationals.
Uruguay went close to a second goal in the closing moments of the first half when veteran striker Diego Forlan's shot took a huge deflection which forced a back-pedalling Navas into a dramatic tip over. In the 54th minute, Costa Rica were level with 21-year-old Campbell, who spent last season on loan at Olympiakos from Arsenal, firing in a superbly controlled drive from Cristian Gamboa's cross.
It got better three minutes later when Duarte dived bravely at the feet of Christian Stuanito to head in a freekick for a 2-1 lead.
Substitute Urena latched on to a fine pass by the influential Campbell in the 84th minute to make it 3-1 before Pereira became the first player sent off at these finals for a wild lunge on Campbell.
TEAMS
URUGUAY: Fernando Muslera - Maxi Pereira, Diego Lugano (cap), Diego Godin, Martin Caceres - Cristhian Stuani, Walter Gargano (Alvaro Gonzalez 60), Egidio Arevalo, Cristian Rodriguez (Abel Hernandez 76) -Edinson Cavani, Diego Forlan (Nicolas Lodeiro 60)
Yellow card: Diego Lugano (50), Walter Gargano (56), Martin Caceres (81)
Red card: Maxi Pereira (90+4)
COSTA RICA: Keylor Navas - Cristian Gamboa, Oscar Duarte, Giancarlo Gonzalez, Michael LI mana, Junior Diaz - Bryan Ruiz (cap) (Marco Urena 83), Celso Borges, Yeltsin Tejeda (Jose Cubero 75), Christian Bolanos (Michael Barrantes 89) - Joel Campbell Referee: Felix Brych (GER)