& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Nadal storms into last 8

AFP, Paris
Eight-time champion Rafael Nadal brushed aside outclassed Dusan Lajovic 6-1,6-2, 6-1 on Monday to storm into the French Open
quarterfinals.
British seventh seed Andy Murray followed Nadal's footsteps to defeat Spain's Fernando Verdasco 6-4, 7-5, 7-6 (7/3) on Monday to reach the quarters.
World number one Nadal, was at his ruthless best.
Watched by US rock star Prince, who played a concert in the French capital on Sunday night, Nadal, seeking to become the first man to win five French Opens in a row, needed just 93 minutes to go through to a last-eight showdown with compatriot David Ferrer.
The two men met in last year's final where Nadal allowed Ferrer just eight games.
Despite his Philippe Chatrier court mauling, Lajovic at least had the consolation of avoiding the worst Roland Garros rout handed out by Nadal.
That unwanted record belongs to Juan Monaco who won just two games in a fourth round loss in 2012.
Spanish fifth seed David Ferrer reached his 10th successive Grand Slam quarterfinal with a 6-3, 6-3, 6-7 (5/7), 6-1 win over South Africa's Kevin Anderson in the fourth round.
Ferrer, last year's runner-up, will face either defending champion Rafael Nadal or Serbia's Dusan Lajovic for a place in the semi-finals.
Ferrer had beaten Anderson, who was hoping to be the first South African man in the last eight since Cliff Drysdale in 1967, at the same stage of the tournament last year.
In the women's matches Andrea Petkovic reached her fourth career Grand Slam quarterfinal when she outlasted Dutch qualifier Kiki Bertens 1 -6,6-2,7-5 in the fourth round.
The German, 26, will now meet Italian Sara Errani, ranked 10th, fora place in the semifinals.
Italian Sara Errani reached the quarterfinals as the 10th seed defeated Serbia's Jelena Jankovic 7-6 (7/5), 6-2.
Errani, the 2012 runner-up to Maria Sharapova, won a bitterly contested first set that lasted lhr 21 min and saw eight breaks of serve, four from each player.
Romanian fourth seed Simona Halep reached the quarterfinals as she defeated American Sloane Stephens 6-4, 6-3.
The highest ranked player left in the women's draw equalled her best showing at a Grand Slam, as she racked up a perfect six breaks from six opportunities in a match lasting lhr 18min.
She now faces either Russian 2009 French champion Svetlana Kuznetsova or Czech Republic's 24th seed Lucie Safarova for a place in the semi-finals.