& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Atletico end 18-year wait

AFP, Barcelona
Atletico Madrid claimed their 10th Spanish league crown on Saturday but first in 18 years after coming from behind to draw 1 -1 away at title rivals Barcelona.
Alexis Sanchez's stunning strike fired Barca into the lead on 33 minutes, but Diego Godin's header four minutes into the second-half was enough to give Atletico the point they needed to become the first side other than Barca and Real Madrid to win La Liga in 10 years.
A point for both sides means that Barca finish the season ahead of third-placed Real Madrid thanks to a better head-to-head record, three points adrift of Atletico.
The visitors had started brightly but were dealt a huge blow after just 15 minutes when top scorer Diego Costa pulled up with the recurrence of a hamstring injury that will also make him a huge doubt for the Champions League final against Real Madrid next weekend.
Arda Turan was then also forced off with a hip injury as Adrian Lopez and Raul Garcia entered the fray.
Barca grew into the game as the half developed and could have been ahead when Pedro Rodriguez wastefully headed over Dani Alves' precise cross from the right.
When the Catalans did go in front just after the half hour it was in spectacular fashion as Lionel Messi cushioned the ball into Sanchez's path on the right side of the area, but despite the narrow angle he managed to thrash the ball high past Thibaut Courtois at the Belgian's near post.
Atletico forced a series of corners without carving out a clear-cut chance in their search for an equaliser before the break, but the half-time whistle also brought frustration on
the part of the Barca players as both Messi and Sergio Busquets were booked for dissent.
David Villa came within inches of an equaliser a minute after the restart when his low effort came back off the post and the former Barca striker had another opening moments later that was smothered by Jose Manuel Pinto in the Barca goal.
However, Diego Simeone's men only had to wait a minute longer to be level as Godin rose highest in the box to power home Gabi's corner.
HONOURS
Spanish La Liga title (10): 1939-40,1940-41,1949-50,1950-51,1965-66,1969-70,1972-73,1976-77,1995-96,2013-14
Copa del Rey (10): 1959-60,1960-61,1964-65,1971-72,1975-76, 1984-85,1990-91,1991-92,1995-96,2012-13
Spanish Supercup (1): 1985
UEFA Europa League (2): 2009-10,2011-12
UEFA Cup Winners' Cup (1): 1961-62
UEFA Supercup (2): 2010,2012
Intercontinental Cup (1): 1974