& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Nadal storms into last four Sharapova sails, Serena withdraws

AFP, Madrid
World number one Rafael Nadal stormed into the semifinals of the Madrid Masters on Friday with his 17th consecutive win over Tomas Berdych, 6-4, 6-2.
Maria Sharapova also booked her place in the last four of the Madrid Open with a three-set win over Li Na, but top seed and reigning champion Serena Williams was forced to pull out of the tournament due to a thigh injury.
Despite coming into the tournament with doubts following surprise defeats to David Ferrer and Nicolas Almagro in recent weeks, Nadal has looked in fine form in the Spanish capital as he has cruised into the last four without the loss of a set.
The 13-time Grand Slam champion will meet compatriot Roberto Bautista Agut or Colombia's Santiago Giraldo on Saturday for a place in the final.
Williams was due to face Petra Kvitova in the quarter-finals but pulled out due to a thigh injury she had been carrying since sweeping aside Swiss teenager Belinda Bencic in the first round on Sunday.
"I have a left thigh injury and, unfortunately, have to withdraw from this year's Madrid Open," said Williams.
"It happened during my first round match. It started to get better, but most importantly right now, I just need some time to rest and recover.
"It's beyond words. It's so frustrating."
However, the American insisted that she will try to defend her title at the Italian Open in Rome next week.
"I am planning to play in Rome. Fortunately, I have a bye next week so will have an extra day of rest.
"For now, I will take it one day at a time and take advantage of some
extra rest."
Sharapova has been beaten by Williams in Madrid in the last two years, including in the 2013 final, and the Russian is now the favourite to clinch her first title in the Spanish capital as she edged a thrilling match against second seed Li 2-6,7-6 (7/5), 6-3.
" I will say the match was very close. I think it really could have gone her way today," admitted Sharapova.
"It was just a matter of a few points in the second set and in the third, although I was up a break throughout the third set, you know she's not going to let go. I didn't win the match until the last point was played."
Li looked on course for the semifinals when she broke to lead 4-3 in the second set.
However, Sharapova broke back immediately and, despite needing four set points, finally forced the match into a deciding set when Li netted at 5-6 down in the tie-break.