& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

NEWS in brief
Youth beaten to death in capital
Staff Correspondent
A mob beat a youth to death suspecting that he was a thief in the capital's Uttara area early yesterday.
The deceased, Suzon Mia, 19, was a restaurant employee.
An under construction building's security guard Abul Kashem's son Nazrul caught him at the building after a ceiling fan had been stolen from there on Thursday, said Uttara Paschim police Officer-in-Charge Rafiqul Islam.
Later, locals gave him a good beating killing him instantly, he said. Police detained Kashem and his wife Ambia while Nazrul fled, he added.
Swechhasebak League man's body found
Staff Correspondent, sylhet
Police recovered the hanging body of an Awami Swechhasebak League activist from an under-construction building near his Purkayostha Para village residence under Osmaninagar upazila in Sylhet Thursday afternoon.
Arjun Bhowmik, 20, who was missing since Sunday, might have committed suicide, Family said.
Police sent the body to MAG Osmani Medical College for an autopsy. An unnatural death case was filed.
Zainal wins Chand Sultana Award
City Desk
Zainal Abedin, a rickshaws puller, has won Chand Sultana Award-2013 for his social activities.
State Minister for Women and Children Affairs Meher Afroz Chumki as chief guest handed over the award at Dhaka Ahsania Mission auditorium in the capital's Dhanmondi on Wednesday, says a press release.
The award initiated by DAM consists of cash Tk 1 lakh, a crest, a certificate and a set of books and training materials published by late Chand Sultana, a social worker.
DAM President Kazi Rafiqul Alam was also present.
Worker dies from electrocution
Our Correspondent, chuadanga
A worker died after being electrocuted in Dehati Pole Factory in Shantashpur village under Jibannahar upazila in Chuadanga yesterday morning.
Family said Rasel, 20, son of Abdul Malek of the village, came in contact with live electric wire while repairing an electric switch board in the factory.
Locals took him to Chuadanga Sadar Hospital where doctors delared him dead.
Man hit with brick bat dies
Staff Correspondent
A man died at Dhaka Medical College Hospital seven hours after he was hit with a brick bat during Thursday night's storm at East Islambagh in the capital's Chakbazar area.
Nure Alam,l 45, an employee at a scrap metal shop, was injured while returning home.
Fateja Begum said his husband entered the house with severe head injury around 11:30pm and was rushed to the hospital. An unnatural death case was filed, said police.