& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Bayern romp into semis

AFP, Munich
Holders Bayern Munich romped into the Champions League semifinals with a 3-1 victory at home to Manchester United in Wednesday's quarterfinal, second-leg to win 4-2 on aggregate.
Having drawn 1-1 at Old Trafford in last
week's first-leg, Bayern had to come from behind after United's left-back Patrice Evra put the guests ahead with a superb second-half strike at Munich's Allianz Arena.
But Bayern equalised almost immediately through a diving Mario Mandzukic header, the first of their three goals in the final half an hour.
Thomas Mueller then tapped Bayern into the lead before Arjen Robben slotted the hosts third to knock David Moyes' United out of the competition.
The first-half was a tense, tactical affair with Bayern failing to exploit their customary 70 percent possession as United packing their defence, forced the Germans to attack through the middle with little success.
Manchester's wing-backs Phil Jones and Evra worked tirelessly to contain Bayern's wingers Robben and Franck Ribery, limiting the Bavarians' main source of chances.
Just as they had in the first-leg, United gave a masterclass in how to defend against Bayern's star-studded attack with their deep-lying defence quickly closing down any spaces the Germans managed to open up and tightly marking Bayern's stars.
The ten first-half chances Bayern created in peppering the United goal to the single Manchester effort - when Luis Valencia had a goal disallowed - told it's own tale.
United looked to have taken a first-half lead when Luis Valencia converted Wayne Rooney's cross at the back post, but the effort was ruled offside.
Robben was United's chief tormentor in the first 45 minutes and he threatened with a probing run into the area before his final shot was charged down just before the halftimewhistle.
United put the Bayern defence under pressure after the break and they were rewarded when Evra gave the guests the lead with a thunderbolt of a shot which gave Neuer no chance as it hit the top right-hand corner on 57 minutes.
The lead lasted just under two minutes as Ribery was released on the left wing and his cross was met by Mandzukic who beat Evra to the diving header.
Germany's Mueller then put the defending champions in the last four when he flicked Robben's cross past United goalkeeper David de Gea on 68 minutes.
And the hosts turned the screw on United when Robben was finally rewarded with a 76th-minute goal which he had threatened to produce all night.