& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

REAL destroy Schalke

AFP, Gelsenkirchen
Real Madrid cruised to a rare victory on German soil as they romped to a 6-1 win at Schalke 04 in Wednesday's Champions League's last 16, first-leg clash.
Real are now all but guaranteed a quarterfinal place regardless of the return leg in Madrid on March 18 after Karim Benzema and Gareth Bale both netted twice in the rout.
Real's Ballon d'Or winner Cristiano Ronaldo also scored twice to see him take over from Zlatan Ibrahimovic as the competition's top-scorer with 11 European goals this season.
Netherlands striker Klaas-Jan Huntelaar scored a 91st-minute consolation goal for Schalke, but the Royal Blues still suffered their heaviest defeat in European competition.
Carlo Ancelotti's Real are now unbeaten in their last 27 games dating back to October.
The huge victory went some way to correcting Real's terrible away record in Germany as they made the Royal Blues of Schalke look anything but regal.
This was only Real's second win in 26 visits to Germany after 18 defeats, including their 4-1 drubbing at Borussia Dortmund in last season's Champions League's semi-final.
Real needed just 13 minutes to take the lead at the Veltins Arena as their star-studded attack
clicked into gear.
Wales winger Bale cut in from the right, Ronaldo flicked his pass into space and Benzema beat the Welshman to the loose ball and fired past Schalke goalkeeper Ralf Faehrmann.
Schalke almost immediately equalised as teenage midfielder Max Meyer fired over the bar with the goal at his mercy after Ilker Casillas had blocked Iulian Draxler's shot.
Schalke were punished for wasting their rare opportunity and with 21 minutes gone, Bale held off two Schalke defenders to make it 2-0 with La Liga leaders in full control.
Schalke's situation was not helped by Ronaldo effortlessly switching with Bale from the left to the right wing midway through the first half, only to revert back after the break.
Schalke came out all guns blazing for the second-half as Kevin-Prince Boateng forced Casillas into a rare save.
But Ronaldo finally got on the scoresheet at the fourth attempt to claim his 10th European goal of the season in his sixth Champions League match.
He effortlessly turned Cameroon centre-back Joel Matip inside, then out before tucking the ball just inside the far post with 52 minutes gone
Just five minutes later, his deft backheel fell into Benzema's path for the Frenchman to drill home his second of the night and Real's fourth past the despairing Faehrmann.