& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Real keep up chase
Real Madrid shrugged off the loss of the injured Gareth Bale as they beat Valencia 3-2 on Sunday to move back to within five points of Barcelona and Atletico Madrid at the top of La
Lig Barcelona were also victors on Sunday as an eight-minute hat-trick from Pedro Rodriguez helped them come from 2-0 down to win 5-2 away at Getafe.
Bale's replacement Angel di Maria put Madrid in front with a fine left-footed drive on 28 minutes, but Pablo Piatti headed home an equaliser for the hosts six minutes later.
Cristiano Ronaldo then headed home Di Maria's free-kick put Madrid back in front five minutes before half-time, only for Valencia to level once more when Jeremy Mathieu met Dani Parejo's corner.
However, Madrid were not to be denied as substitute Jese Rodriguez grabbed the winner with a low drive that beat Vicente Guaita at his near post 10 minutes from time.
With Bale sidelined for a second consecutive game by a calf injury, Di Maria had another chance to impress and made his presence felt in style as he controlled Marcelo's cross-field pass before firing past Guaita into
the far corner.
Valencia, buoyed by the news earlier in the day that Singaporean businessman Peter Lim may be on the verge of taking over the club, responded almost immediately as the diminutive Piatti found space inside the area to head home Juan Bernat's cross.
Madrid were back in front six minutes later in somewhat controversial circumstances as Ronaldo's goal was allowed to stand despite the Portuguese appearing to be slightly offside as Di Maria delivered a free-kick from wide on the right.
The hosts were level once again, though, just after the hour mark when Mathieu outjumped Sergio Ramos to flick home Parejo's corner.
However, Madrid found the goal they desperately needed to get their title hopes alive as Luka Modric picked out Jese inside the area and his fiercely driven effort slipped through the grasp of Guaita. RESULTS
Espanyol 4 (Sergio Garcia 5-pen, Stuani 37,70, Sanchez 68) Valladolid 2 (Javi Guerra 75, Perez 88)
Getafe 2 (Escudero 10, Lisandro 14) Barcelona 5 (Pedro 35,41,43, Fabregas 68,72-pen)
Athletic Bilbao 2 (San Jose 33, Mikel Rico 66) Rayo
Vallecanol (Bueno 61)
Valencia 2 (Piatti 34, Mathieu 62) Real Madrid 3 (Di Maria 28, Ronaldo 40, Jese 82)
Celta Vigo 1 (Fernandez 34) Osasuna 1 (Armenteros 17)