& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Juve stretch lead

AFP, Milan
CALC/0 Arturo Vidal and Giorgio Chiellini struck in either half to hand Juventus a 2-0 away win at Bologna on Friday which gave the Serie A leaders a six-point lead over second-placed Roma.
Four days ahead of a crucial trip to
Istanbul, where Juve need a point against Galatasaray to qualify for the last 16 of the Champions League, coach Antonio Conte left a host of regulars on the bench.
However their absences did not hinder the champions, who opened the scoring through Vidal on 12 minutes before Chiellini headed home at the death.
Juve have now gone seven Serie A games without losing or conceding a goal, and Chiellini told Sky Sport Italia: "We all played well against a very tough Bologna side... we have to continue this victory' run.
"Now, our thoughts are on Istanbul and Galatasaray. It's like a final, a turning points in the season for us. We need the match of our lives."
Fabio Quagliarella and Mirko Vucinic led Juve's attack, leaving Carlos Tevez and Fernando Llorente to make later appearances from the bench, while Angelo Ogbonna replaced centre-back Leonardo Bonucci.
Mauricio Isla and Federico Peluso were also deployed as wing-backs in place of Stephan Lichsteiner and Kwadwo Asamoah, while Paul Pogba took the injured Andrea Pirlo's role in the centre of midfield.
Despite the reshuffling, Juve had no trouble dictating play against a side that has only one home win so far this season and were sent crashing out of the Italian Cup at home by Serie B side Siena on Tuesday.
Juve should have had several goals by the interval but Quagliarella and Claudio Marchisio spurned early chances against impressive home 'keeper Gianluca Curci.
The visitors eventually found the net when Peluso's cross found Vidal unmarked and the Chilean had no trouble sending it over the onrushing Curci.
Quagliarella then sent an effort just wide under a challenge from Mikael Antonsson while, at the other end, Gianluigi Buffon produced two solid blocks to deny long-range efforts from Alessandro Diamanti, the first from a free-kick.
Two minutes later, Bologna saw claims for a penalty waved away after the ball struck Vucinic's arm.
The Montenegrin had earlier come down hard under a challenge and was replaced by Llorente just before the break.
Bologna threatened briefly at the end of the half, when Vidal saw a shot go wide after Llorente's dribbling run left the Chilean with a clear shooting chance.