& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

India sweep series 2-0

Pn, Mumbai
The legend-a r y Sachin Tendulk
ar got a memorable gift in his emotionally-charged farewell Test which lasted just about two and a half days as India crushed a hapless West Indies by an innings and 126 runs to complete a 2-0 whitewash in one of the most lopsided contests in recent history.
Starting the day at 43 for three, the West Indies were skittled out fora paltry 187 in their second innings as Pragyan Ojha completed a matchhaul of 10 wickets taking his second five-for.
Only seven sessions
of play was possible in a Test match in which one of the most respected and celebrated cricketers in the history bid goodbye to the game in front of his home crowd and his family, many of whom watched him for the first time from the stands.
SCOREBOARD
WEST INDIES: First innings 182 (Powell 48, Bravo 29, Chanderpaul 25, Deonarine 21; Ojha 5-40, Ashwin 3-45)
INDIA: Firstinnings
VijaycSammybShillingford 43
DhawancChanderpaulb Shillingford 33 Pujaracandb Shillingford 113 TendulkarcSammybDeonarine 74 Kohli c Sammy b Shillingford 57 Sharma not out 111 Dhoni c Sammy b Best 4 Ashwin c and b Gabriel 30 KumarcSammybShillingford 4 Ojha run out (Powell) 0 Shamic Best b Deonarine 11 Extras:(b-8,lb-2,w-2,nb-3) 15 Total: (All out in lO8overs) 495 Fall of wickets: 1-77,2-77,3-221,4-315, 5-354, 6-365, 7-409,8-414, 9-
Bowler 0 M R W
Sammy 9 1 41 0
Gabriel 16 0 85 1
Shillingford 43 6 179 5
Best 18 0 93 1
Samuels 11 0 42 0
Deonarine 11 0 45 2
WESTINDIES:Second innings
Gayle c Dhoni bOjha 35
Powell cShamib Ashwin 9
Best lbw bOjha 9
Bravo c Vijay b Ashwin 11
Samuels st Dhoni bOjha 11
Chanderpaul lbw b Ashwin 41
Deonarine c and bOjha 0
Ramdin notout 53
Sammy lbw bOjha 1
Shillingford lbw b Ashwin 8
Gabriel bShami 0
Extras: (b-4,lb-5) 9
Total: (All out in 47 overs) 187
Fall ofwickets:1-15,2-28,3-43,4-74, 5-87,6-89,7-157,8-162,9-185
Bowler 0 M R W
Kumar 3 0 4 0
Shami 7 0 28 1
Ashwin 17 4 89 4
Ojha 18 6 49 5
Tendulkar 2 0 8 0
Result: India won by an innings and 126 runs and clinched the 2-Test series 2-0.
Player-of-the-match: Pragyan Ojha.
Player-of-the-series: Rohit Sharma.