& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

SA 6 wickets away from victory

AFP, Dubai
Pakistan were staring defeat in the second Test in the face after South Africa out- batted them and then bowled well on the third day in Dubai on Friday.
South Africa, seeking a series-levelling win, once again rocked Pakistan's top order with three early wickets after compiling a mammoth 517 in their first innings for a big 418-run lead at Dubai Stadium.
At the close, Pakistan captain Misbahul Haq (42) and Asad Shafiq (28) were at the crease but they still need a whopping 286 runs to avoid an innings defeat or bat out two days to force a draw.
The duo have added 62 for the fifth wicket and would need a Herculean effort to avoid defeat. But South Africa's bid for victory, and keeping their seven-year unbeaten away series record, was tainted when they were docked five penalty runs by the onfield umpires after television replays showed Faf du Plessis apparently trying to tamper with the ball in Pakistan's 31 st over.
The two umpires, Rod Tucker of Australia and Ian Gould of England, called South African captain Graeme Smith for a warning, changed the ball and added five penalty runs to Pakistan's total.
SCOREBOARD
PAKISTAN: First innings 99 (Masood 21, Azhar 19, Babar 25 not out; Tahir 5-32, Steyn 3-38)
SOUTH AFRICA: First innings (overnight 460-4)
Petersen lbw b Babar 26
Smith cYounisbAjmal 234
ElgarcAzharbAjmal 23
KallisIbwbAjmal 7
Steyn b Irfan 7
DeVillierscAkmalblrfan 164
Duminyb Irfan 7
Du Plessis not out 17
PhilanderbAjmal 8
MorkelcYounisbAjmal 7
TahircMisbahbAjmal 2
Extras:(b-5,lb-8,w-2) 15
Total: (All outin 163.1 overs) 517
Fall of wickets: 1-37, 2-91, 3-119, 4-134,5-472,6-478,7-486,8-505,9-515.
Bowler 0 M R W
Irfan 34.3 5 102 3
Junaid 31.3 2 105 0
Ajmal 55.5 8 151 6
Babar 36.2 2 124 1
Azhar 5 0 22 0
PAKISTAN: Second innings
Masood lbw b Steyn 0
ManzoorcKallisb Philander 0
AzharlbwbDuminy 19
YounisbTahir 36
Misbah notout 42
Shafiq notout 28
Extras: (nb-1, w-1 pen-5) 7
Total: (For4wkts in 55 overs) 132
To bat: Akmal, Ajmal, Babar, Junaid, Irfan.
Fall of wickets: 1 -0,2-2,3-48,4-70.
Bowler 0 M R W
Steyn 10 4 17 1
Philander 8 2 16 1
Morkel 9 4 18 0
Tahir 16 3 47 1
Kallis 3 2 10
Duminy 9 0 28 1