& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Faulkner blitzes India

Deccan Chronicle
Chasing a stiff target of 304, the Australians rode on James Faulkner's brutal un^eaten 29-balI 64, which ^^^^ was studded with two fours and six sixes, to dramatically change the complexion of game and take his side home with three balls to spare.
Adam Voges made a valuable contribution of 76 not out from 88 balls, which was studded with seven fours.
A hugely costly over by out-of-form pacer Ishant Sharma who gave 30 runs in the 48th turned the tide in Australia's favour after the Indians seemed cruising comfortably.
It was a commendable show by the Australians and the Indians paid the price of the lack of quality death bowlers in a high scoring match on a good batting track at the PCA Stadium.
Earlier, Dhoni produced a magnificent late onslaught as he rescued India from a precarious 76 for four at one stage to singlehandedly take the score to 303 for 9 after the home side were asked to bat. His unbeaten knock came from 121 balls with the help of 12 fours and five sixes. Virat Kohli was the other notable contributor with a 73-ball 68.
But it was not the day for the Indians as Faulkner hit four sixes and a four in the 48th over bowled by Ishant to turn the match on its head. R Ashwin bowled a very good penultimate over just giving away five runs as Australia needed nine runs from the final over.
Faulkner ended the match in style with a six in the third ball of the final over as Australia reached 304 for six to win the match to the disappointment of the capacity crowd.
The two sides now moved to Ranchi for the fourth ODI on October 23.
Australia made a solid start in their run chase with the openers Phil Hughes and Aaron Finch sharing 68 runs in 12.2 overs but seemed to have lost the plot after that.
Pacers Bhuvneshwar Kumar, R Vinay Kumar and Ishant bowled a tight line and length that squeezed the runs and built pressure on the Australians who were reduced to 88 for three in the 20th over.
Captain George Bailey (43) and Voges then stitched a 83-run stand for the fourth wicket before Australia were dealt a blow in the 37th over as they lost two wickets in the same over. Bailey and Glenn Maxwell (3) departed in the space of five balls to leave the visiting side at 174 for five.
Four balls later, Shikhar Dhawan came up with a gem of a fielding effort as his direct throw led to the run out of Maxwell who was involved in a mixed-up with Voges.
Haddin (24) was out ion the 42nd over and Australia seemed to be heading towards a defeat with the asking rate having shot up 10 an over before Faulkner and Voges saw took them home.
Earlier, Dhoni led from the front by smashing an unbeaten 139 as India recovered from a poor start to post a massive 303 for nine.
Dhoni rescued India after early jitters as he played a responsible and sensible innings that came off just 121 balls, including 12 fours and five sixes.
SCORES IN BRIEF
INDIA: 303 for 9 in 50 overs (Dhoni 139 not out, Kohli 68; Johnson 4-46) AUSTRALIA: 304 for 6 in 49.3 overs (Voges 76 notout, Faulkner64 notout, Bailey43) Result: Australia won by 4 wickets
Man of the Match: James Faulkner (Australia)