& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Experts find polonium on Arafat clothing

AFP, Paris
Swiss radiation experts have confirmed they found traces of polonium on clothing used by Yasser Arafat which "support the possibility" the veteran Palestinian leader was poisoned.
In a report published by The Lancet at the weekend, the team provide scientific details to media statements made in 2012 that they had found polonium on Arafat's belongings.
Arafat died in Prance on November 11 2004 at the age of 75, but doctors were unable to specify the cause of death. No autopsy was carried out at the time, in line with his widow's request.
His remains were exhumed in November 2012 and samples taken, partly to investigate whether he had been poisoned - a suspicion that grew after the assassination of Russian exspy and Kremlin critic Alexander Litvinenko in 2006.
That investigation is ongoing, con- ducted separately by teams in France, Switzerland and Russia.
In the Lancet report, eight scientists working at the Institute of Radiation Physics and University Centre of Legal Medicine in Lausanne said they had carried out radiological tests on 75 samples.
Thirty-eight samples came from Arafat's belongings, including underwear, a shapka hat toothbrush, a hospital cap and sportswear, that were provided by the Palestinian leader's widow Suha Arafat.
These were checked against 37 "reference" samples of cotton clothing that had been kept in an attic for 10
years and protected from dust.
"Several samples containing body fluid stains (blood and urine) contained higher unexplained polonium 210 activities than the reference samples, " says the case report.
"These findings support the possibility ofArafat's poisoning with polonium 210."
The polonium samples were measured at "several mBq," or millibecquerels, a unit of radioactivity.
Computer modelling, which calculates polonium's very fast decay, found that these levels "are compatible with a lethal ingestion of several GBq," or several billion becquerels, in 2004, they said.
In addition, says the report, Arafat's clinical symptoms "could not rule out" polonium poisoning. These include nausea, vomiting, fatigue and abdominal pain.
They acknowledge, though, that Arafat showed no hair loss or decline in bone marrow activity - symptoms that typically occur in radiation poisoning.