& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

'Bionic man' walks

AP, New York
Gentlemen, we can rebuild him, after all. We have the technology.
The term "bionic man" was the stuff of science fiction in the 1970s, when a popularTV show called "The Six Million Dollar Man" chronicled the adventures of Steve Austin, a former astronaut whose body was rebuilt using artificial parts after he nearly died.
Now, a team of engineers has assembled a robot using artificial organs, limbs and other body parts that comes tantalizingly close to a true "bionic man." For real, this time.
The artificial "man" is the subject of a Smithsonian Channel documentary that airs Sunday, Oct 20 at 9:00pm. Called "The Incredible Bionic Man," it chronicles engineers' attempt to assemble a functioning body using artificial parts that range from a working kidney and circulation system to cochlear and retina implants.
The parts hail from 17 manufacturers around the world. This is the first time they've been assembled together, says Richard Walker, managing director of Shadow Robot Co and the lead roboticist on the project.
"[It's] an attempt to showcase just how far medical science has gotten," he says.
The robot making appearances in the US for the first time this week. Having crossed the Atlantic tucked inside two metal trunks — and after a brief holdup in customs — the bionic man will strut his stuff at the New York Comic Con festival on Friday.
Walker says the robot has about 60 to 70 percent of the function of a human. It stands six-and-a-half feet tall and can step, sit and stand with the
help of a Rex walking machine that's used by people who've lost the ability to walk due to a spinal injury. It also has a functioning heart that, using an electronic pump, beats and circulates artificial blood, which carries oxygen just like human blood. An artificial, implantable kidney, meanwhile, replaces the function of a modern-day dialysis unit.
Although the parts used in the robot work, many of them are a long way from being used in humans. The kidney, for example, is only a prototype. And there are some key parts missing: there's no digestive system, liver, or skin.
And, of course, no brain.
The bionic man was modelled after Bertolt Meyer, a 36-year-old social psychologist at the University of Zurich who was born without his lower left arm and wears a bionic prosthesis. The man's face was created based on a 3D scan of Meyer's face.
"We wanted to showcase that the technology can provide aesthetic pros-theses for people who have lost parts of their faces, for example, their nose, due to an accident or due to, for example, cancer," Meyer says.
Meyer says he initially felt a sense of unease when
he saw the robot for the first time.
"I thought it was rather revolting to be honest," he says. "It was quite a shock to see a face that closely resembles what I see in the mirror every morning on this kind of dystopian looking machine."
He has since warmed up to it, especially after the "man" was outfitted with some clothes from the UK department store Harrods.
And the cost? As it turns out, this bionic man comes cheaper than his $6-mi 11 ion-do 11 ar sci-fi cousin. While the parts used in the experiment were donated, their value is about $1 million.