& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Rafa, Novak on course

AFP, Shanghai
Rafael Nadal survived a fierce assault from Stanislas Wawrinka to reach the Shanghai Masters semifinals Friday, staying on course for a potential title
match against Novak Djokovic, who recovered from a set down to also claim victory.
World number one Nadal was pushed to the limit by Wawrinka in a highly competitive first set but the relentless Spaniard came out on top in a gripping tie-break lasting more than 20 minutes.
It was one-way traffic in the second set as he prevailed 7-6 (12/10), 6-1.
Top seed Djokovic kept his side of the bargain under floodlights at the Qizhong Tennis Center, withstanding a feisty challenge from Frenchman Gael Monfils to win his quarter-final 6-7 (4/7), 6-2,6-4.
Elsewhere in last-eight action, Jo-Wilfried Tsonga and Juan Martin del Potro breezed through their matches in straight sets as they hunt berths at next month's elite World Tour Finals
Nadal, who has won 10 titles - including the French Open and US Open - this year, fended off three set points for Wawrinka before taking his fourth opportunity to win the opener. A dispirited Wawrinka ran out of steam in the second set against never-say-die Nadal, who regained the number one ranking this week and is chasing a record sixth Masters title in a single season.
Earlier, Monfils and Djokovic swapped two service breaks each before the match settled into a more regular groove, going to a tie-break won by the Frenchman when the top seed went long with a backhand. But Monfils, cutting an imposing figure in his bright orange top with a shock of dark hair, let his intensity slip at the start of the second set and Djokovic immediately seized the initiative with a break.
A time violation against Monfils rattled the Frenchman, who became embroiled in an argument with the umpire and was soon flat on his back receiving treatment on his abdominal muscles as the set slipped away from him.
Monfils, who conquered Roger Federer in the previous round, re-discovered his mojo at the start of the decider, rattling Djokovic. But it was the Serb who made the crucial break, letting out a roar of triumph before going on to seal the match after an absorbing two hours and 22 minutes.
Earlier, Argentine sixth seed Del Potroeased into the semi-finals, firing 27 winners and making just eight unforced errors in a routine 6-3, 6-3 win against Nicolas Almagro, the Spanish 15th seed.
Seventh seed Tsonga was equally impressive, beating 50th-ranked Florian Mayer of Germany 6-2,6-3 in just 64 minutes.