& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Guard murdered at ATM booth

Staff Correspondent
A security guard was murdered while on duty at an ATM booth of Dutch-Bangla Bank Ltd in the capital's Mohammadpur early yesterday.
The deceased, Enamul Haque, 18, an employee of the private security company Elite Force, was found dead with a deep wound in the head in front of the ATM booth on Nurjahan Road around 5:20am, Javed Chowdhury, in-
charge of the company's Mohammadpur zone, toldThe Daily Star.
The motive behind the murder was not clear. There was no sign of any
FROM PAGE 1 attempts to break into the booth, said police.
"My night supervisor called me around 5:20am. He told me that a staff of another security company had informed him over the phone that one of our security personnel lay bleeding in front of his station," said Javed.
Footage from a closed-circuit camera inside the booth shows that Enamul was at his post till 5:10am, Biplob Kumar Sarker, deputy com-missioner of Dhaka Metropolitan Police (Tejgaon), told The Daily Star.
The footage shows that a middle-aged woman crossed the street and talked to Enamul, who immediately moved away from the camera's line of vision at 5:10am. It was the last time he was seen on the camera that captured the images through the glass door of the booth.
There were seven more cameras inside the booth, but none captured the murder.
However, the footage showed that a group of four to five people gathered in front
ofthebooth around 5:26am, said the DMP deputy commissioner.
He said Enamul was killed between 5:10am and 5:26am.
Police arrived at the scene around 6:00am and took Enamul to Dhaka Medical College Hospital where doctors pronounced him dead.
His body was then sent to Dhaka Medical College morgue for autopsy.
Sources at the morgue told The Daily Star that Enamul was hit hard in the head by a heavy object.
The DMP deputy commissioner said the murderers did not even try to unlatch from Enamul's body the key to the ATM booth that had remained locked during the night.
Biplob said the woman, who was seen talking to Enamul in the footage, is the primary suspect in the murder.
He said the murder might have been committed follow-ingsomepersonal feud.
However, Enamul's par-ents, who live in Mohammadpur, said their son had no enmity with anyone.