& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Baye n go top

AFP, Berlin
European champions Bayern Munich went top of the Bundesliga for the first time this season on Saturday after a pulsating 1-1 draw at Bayer Leverkusen.
Bayern extended their unbeaten run to 33 Bundesliga games and are closing in on Hamburg's record of 36, set in January 1983, as the Bavarians returned to the site of their last league defeat in October 2012.
Previous leaders Borussia Dortmund lost top place after suffering a shock 2-0 defeat at Borussia Moenchengladbach earlier in the day.
In a high-tempo clash at Leverkusen's BayArena, Germany midfielder Sidney Sam's 31 st-minute equaliser for the hosts came straight after Toni Kroos' opening goal for Bayern.
Pep Guardiola's Bayern took the lead when France wing Franck Ribery found Kroos on the edge of the area and the attacking midfielder blasted home.
But Leverkusen drew level when Germany goalkeeper Manuel Neuer parried Poland defender Sebastian Boenisch's shot, but the rebound fell to Sam to tap home into an empty net.
Bayern, fresh from Wednesday's 3-1 Champions League win at Manchester City, again dominated possession - nearly 80 percent - but were continually frustrated by some determined defending.
Leverkusen goalkeeper Bemd Leno guaranteed earned a point for his side by denying Ribery twice in as many second-half minutes. Germany midfielder Bastian Schweinsteiger had a late header cleared off the line, while Leverkusen's Son Heung-Min blasted wide with the final shot of the game.
The single point was enough to send Bayern top, with Leverkusen third, behind Borussia Dortmund.
Fresh from their impressive 3-0 Champions League win over Marseille, Dortmund were set to claim an away point until a disastrous final 10-minute spell.
Germany defender Mats Hummels earned a red-card on 81 minutes with a reckless challenge on 'Gladbach’s Norway midfielder Havard Nordtveit in the area which left referee Manuel Graefe reaching for the red card.
Germany striker Max Kruse netted the resulting penalty, then Brazilian forward Raffael hit their second four minutes from time to see 'Gladbach move up to fourth.
Dortmund dropped to second in the league, a point behind Bayern, and level on 19 points with third-placed Leverkusen.