& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Strongly Williams

Reuters, New York
Serena Williams repeated as US Open women's champion by holding off a battling Victoria Azarenka of Belarus 7-5, 6-7(6), 6-1 in a windblown final at Arthur Ashe Stadium on Sunday.
Williams bounded in a series of joyous jumping jack leaps after Azarenka's backhand sailed long on the second match point of a thrilling, two-hour 45-minute final that earned her a fifth US Open singles title that took her total to 17 Grand Slams.
The big-hitting American, who turns 32 later this month, became the oldest US Open women's winner since tennis turned professional 45 years ago, eclipsing Australian Margaret Court, who was 31 years and 55 days when she won the title in 1973.
The triumph moved Williams to within one
Grand Slam singles crown of Chris Evert and Martina Navratilova for a tie for fourth place on the all-time list behind Court (24), Steffi Graf (22) and Helen WillsMoody (19).
It had looked like it was going to be plain sailing for Williams after she won a difficult first set, boosted by a late break in the 11th game for a 6-5 lead and then served out a love game before racing to a 4-1 second-set lead.
Williams, who earlier looked confounded by the gusty wind that affected service tosses and the direction of bounces off groundstrokes and was muttering to herself between points, finally settled into a rhythm in the second set.
"The wind was unbelievable," said the champion. "And it just got worse and worse and it never let up. But at this point you have to play under any circumstance."
She claimed the 4-1 lead after Azarenka double-faulted three times in the fifth and her US
Open repeat looked a certainty as she begun to find her range on her imposing service game that saw her serve broken only twice in six previous matches.
But Azarenka was not ready to capitulate.
"I think it was raising from the first point, the tension, the battle, the determination," the second seed said about the quality of the match. "It was really kind of like boiling the water. It felt from every point, it was rising the level."
The Belarusian showed her fight and took advantage of a string of Williams errors to break right back for 4-2 and rode that momentum.
Twice Williams served for the match, at 5-4 and again at 6-5, but Azarenka rose up to break the American's serve and force a tiebreaker.
Williams took a 3-1 lead but Azarenka won five of the next six points to seize a 6-4 advantage and sent the match to a third set when Williams belted a backhand long to lose it 8-6.