& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

USA, Mexico humbled

AFP, Los Angeles
Costa Rica slowed the USA's । I march toward the 2014 World r \ Cup with a 3-1 win Friday, while Mexico were on even ^^^Kmh shakier ground after a 2-1 loss to Honduras.
Costa Rica moved to the top of the six-nation final qualifying group in North and Central America and the Caribbean (CONCACAF) with the victory in San Jose that ended the USA's 12-match winning streak.
The Ticos now head the group on 14 points, one more than Jurgen Klinsmann's United States.
Mexico, long the powerhouse of the region, are in worse straits heading into another crucial round of matches Tuesday.
Two goals in the space of three minutes in the second half lifted Honduras to victory in Mexico City and into third place in the group that will see three teams advance directly to next year's finals, and the fourth-placed team play off for a berth against New Zealand.
Mexico, held to three dispiriting goalless draws in their three prior qualifiers at Azteca Stadium - the venue where they once dominated all comers - appeared poised to turn things around when Oribe Peralta put them ahead 1 -0 in the sixth minute.
But Jerry Bengtson in the 64th and Carlo Costly in the 66th ensured Flonduras came away with a maximum three points that take their total to 10, with Mexico fourth on 8.
In San Jose, Costa Rica were out for revenge after a bitter 1 -0 defeat to the United States in Denver in March, in a match played in heavy snow.
The hosts jumped to a quick lead as Johnny Acosta beat DaMarcus Beasley on a set-piece corner and headed home a goal in the third minute.
The United states were still reeling when Celso Borges doubled Costa Rica's lead in the 10th, heading in a cross from Christian Bolanos.
Clint Dempsey's first-half penalty - after charging Costa Rican keeper Keylor Navas brought down Fabian Johnson in the box -pulled the United States within 2-1 at halftime.
A more disciplined United States were pressing for an equalizer after the break before Joel Campbell's 75th minute strike restored Costa Rica's two-goal advantage.
Klinsmann, whose team were trying to win a qualifier in Costa Rica for the first time, had to make last-minute changes when midfielder Michael Bradley hurt an ankle warming up. It's not clear if he'll be able to play when the United States host a desperate Mexico in Columbus, Ohio, on Tuesday.