& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Real 3 for 3

AFP, Madrid
Real Madrid continued their unblemished start under new manager Carlo Ancelotti as they beat Athletic Bilbao 3-1 at the Santiago Bernabeu on Sunday to move alongside Villarreal at the top of La Liga.
After a promising start from the visitors, who had also won their opening two games, Madrid began to take control midway through the first-half and went ahead when Isco collected Karim Benzema's lovely scooped pass and lifted the ball beyond Iago Herrerin.
Cristiano Ronaldo then registered his first goal of the season when he nodded Angel Di Maria's free-kick home in first-half stoppage time and Isco made it 3-0 with a deflected strike in the second period before Ibai Gomez scored a consolation for Athletic late on.
With all the transfer speculation surrounding Gareth Bale's imminent arrival in the Spanish capital, it was the absence of one of those rumoured to be leaving the Bernabeu that was the big news pre-match as Mesut Ozil was dropped to the bench by Ancelotti.
Ander Herrera was also only a substitute for Athletic following Manchester United's bid for the midfielder earlier this week as Mikel Rico came in to make his debut.
And Rico nearly had the perfect start as he pounced on a slack header by Alvaro Arbeloa but pulled his shot wide of the target.
Di Maria then had Madrid's first real opening in 16th minute from a ball over the top but he failed to connect properly as he tried to lob Herrerin with his first touch, and the goalkeeper made an easy save.
Ronaldo then saw a low drive tipped around the post from Herrerin and from the RESULTS
Real Madrid 3 (Isco 26,72, Cristiano Ronaldo 45+1)
Athletic Bilbao! (Gomez 79)
Celta Vigo 1 (Rafinha 29) Granada 1 (Piti 62)
Valladolid 1 (Valiente 47) Getafe 0
Osasuna 0 Villarreal 3 (Perbet 23, Aquino 30, Uche 75)
resulting corner Pepe just failed to turn in Sergio Ramos's header.
However, the hosts had to wait just a few minutes more for the opener as Benzema picked out Isco and he controlled and finished calmly to register his second goal in as many games at the Bernabeu since joining from Malaga.
Athletic were enraged moments after the opener, though, as Benat Extebarria's freekick struck Sami Khedira's arm in the wall and referee Carlos Clos Gomez awarded another free-kick just outside the box rather than a penalty. Benat stepped up again and this time saw his effort whistle just past Diego Lopez's left-hand post.
Madrid were continuing to look the more threatening, however, and it was no surprise when they doubled their lead just before the break as Ronaldo rose highest to power home Di Maria's in-swinging free-kick.
Ronaldo was then only denied his second of the afternoon by an excellent stop by
Herrerin as the keeper got down low to parry the Portuguese's free-kick, but Isco did complete his double 20 minutes from time as he con-trolled another pass from Benzema and saw his volley B from the edge of the box deflect in off an Athletic defender.
The visitors did finally get some recompense for their efforts six minutes later when Ibai swept home De Marcos's cut-back.